 {A}	{ABS}	Absolute value
	{ADC}	Add Long with Carry
	{ADD}	Add
	{ADDL}	Shift Left and Add Accumulators
	{ADDR}	Shift Right and Add Accumulators
	{AND}	Logical AND
	{ANDI}	AND Immediate with Control Register
	{ASL}	Aritmetic Shift Accumulator Left
	{ASR}	Arithmetic Shift Accumulator Right
 {B}	{BCHG}	Bit Test and Change
	{BCLR}	Bit Test and Clear
	{BSET}	Bit Test and Set
	{BTST}	Bit Test
 {C}	{CLR}	Clear Accumulator
	{CMP}	Compare
	{CMPM}	Compare Magnitude
 {D}	{DIV}	Divide Iteration
	{DO}	Start Hardware Loop
 {E}	{ENDDO}	End Current DO Loop
	{EOR}	Logical Exclusif OR
 {I}	{ILLEGAL}	Illegal Instruction Interrupt
 {J}	{Jcc}	Jump Conditionally
	{JCLR}	Jump if Bit Clear
	{JMP}	Jump
	{JScc}	Jump to Subroutine Conditionally
	{JSCLR}	Jump to Subroutine if Bit Clear
	{JSET}	Jump if Bit Set
	{JSR}	Jump to Subroutine
	{JSSET}	Jump to Subroutine if Bit Set
 {L}	{LSL}	Logical Shift Left
	{LSR}	Logical Shift Right
	{LUA}	Load Update Address
 {M}	{MAC}	Signed Multiply-Accumulate
	{MACR}	Signed Multiply-Accumulate and Round
	{MOVE}	Move Data
	{I}	Immediate Short Data Move
	{R}	Register to Register Data Move
	{U}	Address Register Update
	{X:}	X Memory Data Move
	{X:R}	X Memory and Register Data Move
	{Y:}	Y Memory Data Move
	{R:Y}	Register and Y Memory Data Move
	{L:},	Long Memory Data Move
	{X:Y},	X Y Memory Data Move
	{MOVEC}	Move Control Register
	{MOVEM}	Move Program Memory
	{MOVEP}	Move Peripheral Data
	{MPY}	Signed Multiply
	{MPYR}	Signed Multiply and Round
 {N}	{NEG}	Negate Accumulator
	{NOP}	No operation
	{NORM}	Normalize Accumulator Iteration
	{NOT}	Logical Complement
 {O}	{OR}	Logical Inclusive OR
	{ORI}	OR Immediate with Control Register
 {R}	{REP}	Repeat Next Instruction
	{RESET}	Reset On-Chip Peripheral Devices
	{RND}	Round Accumulator
	{ROL}	Rotate Left
	{ROR}	Rotate Right
	{RTI}	Return from Interrupt
	{RTS}	Return from Subroutine
 {S}	{SBC}	Subtract Long with Carry
	{STOP}	Stop Instruction Processing
	{SUB}	Subtract
	{SUBL}	Shift Left and Subtract Accumulators
	{SUBR}	Shift Right and Subtract Accumulators
	{SWI}	Software Interrupt
 {T}	{Tcc}	Transfer Conditionally
	{TFR}	Transfer Data ALU Register
	{TST}	Test Accumulator
 {W}	{WAIT}	Wait for Interrupt

