;******* IMAGE     C Sample Program Module Definition File (.DEF) ********
;
;  The module definition file supplies extra information about the program
;  module to the LINKER.
;  Copyright 1991 IBM Corporation
;
;  Note the WINDOWAPI keyword is required for link386
NAME    IMAGE WINDOWAPI

DESCRIPTION  'Image Porting Sample'

DATA    MULTIPLE

HEAPSIZE   4096
STACKSIZE  16376

PROTMODE
