; ******************************************************************************
; * SAMPLE PROGRAM: EHNXNMP   - Sample Name Mapping Exit for DFM/2.            *
; *                                                                            *
; * MODULE NAME:    EHNXNMP.DEF                                                *
; * DESCRIPTION: Module Definition File for the Name Mapping Exit EHNXNMP.DLL  *
; *                                                                            *
; *                                                                            *
; * DFM/2 (program no. 5648-020)                                               *
; * Version: 1.0                                                               *
; * Release: 1.0                                                               *
; *                                                                            *
; * Copyright (C) International Business Machines Corp., 1993.                 *
; *                                                                            *
; * DISCLAIMER OF WARRANTIES:                                                  *
; * The following [enclosed] code is sample code created by IBM                *
; * Corporation.  This sample code is not part of any standard IBM product     *
; * and is provided to you solely for the purpose of assisting you in the      *
; * development of your applications.  The code is provided "AS IS",           *
; * without warranty of any kind.  IBM shall not be liable for any damages     *
; * arising out of your use of the sample code, even if they have been         *
; * advised of the possibility of such damages.                                *
; *                                                                            *
; ******************************************************************************
; * CHANGE ACTIVITY                                                            *
; * Flag Reason      Level    Date   Origin    Comments                        *
; * -------------------------------------------------------------------------- *
; *                           930402 Mueller  : Initial Release                *
; * IBM Deutschland Entwicklung GmbH, Boeblingen, Germany        GMU at SDFVM1 *
; ******************************************************************************

; ******************************************************************************
; * This file is part of the Name Mapping Exit sample program for DFM/2.       *
; * Module Definition File.                                                    *
; * For further description refer to the header of the file EHNXNMP.C          *
; ******************************************************************************

LIBRARY EHNXNMP INITINSTANCE

DESCRIPTION 'IBM DFM/2 EHNXNMP.DLL - Copyright (c) IBM Corporation 1993'
STACKSIZE 10000

CODE LOADONCALL

DATA NONSHARED PRELOAD

SEGMENTS CODE32 ALIAS

EXPORTS
     DFM_Map_to_Client
     DFM_Map_to_Server

; **** end of file *************************************************************
