;
;* PMM Sample Module Definition File ***************************************
;
;  The module definition file supplies extra information
;  about the program module to the LINKER.
;
;  Different HEAPSIZE used. ( 1024 bytes )


NAME pmmsam WINDOWAPI

DESCRIPTION 'PMM Sample'

DATA MULTIPLE

; PMM needs a minimal stack size of about 100 Kb ***************************
STACKSIZE   100000
HEAPSIZE    1024

PROTMODE

