;******* PCSAPI Sample Program Module Definition File (.DEF) ********
;
;  The module definition file supplies extra information about the program
;  module to the LINKER.
;  Copyright 1994, 1996 IBM Corporation
;
;  Different HEAPSIZE used. ( 1024 bytes )


NAME    PCSMAIN

DESCRIPTION 'PCSAPI Sample Program'

CODE  PRELOAD MOVEABLE DISCARDABLE
DATA  PRELOAD MOVEABLE MULTIPLE

HEAPSIZE    1024
STACKSIZE   5120
; All functions that will be called by any Windows routine
; MUST be exported.

EXPORTS
  MainWndProc               @1
  StartDlgProc              @2
  StopDlgProc               @3
  StatusDlgProc             @4
  ProfileDlgProc            @5
  ConnectDlgProc            @6
  DisconnectDlgProc         @7
  SetLinkTimeoutDlgProc     @8
  TitleDlgProc              @9
  About                     @10
