*****************************************************
* Main Menu help                                    *
*****************************************************
*
[HELP=SYS100]
Select the type of transport for the CID Code Server.

|SRVIFS
 To enable the client workstations to access the CID
 Code Server via SRVIFS (NETBIOS application).

|TCPIP
 To enable the client workstations to access the CID 
 Code Server via TCP/IP.

*****************************************************
* Select CID root directory                         *
*****************************************************
*
[HELP=SYS101]
Select the fully qualified root directory of the CID
Directory structure.  Press the ENTER key to accept
the value shown and continue.
