;******* MFREAD.EXE Program Module Definition File (.DEF) ********
; The module definition file supplies extra information about the program module to the LINKER.
; Note the WINDOWCOMPAT keyword is required for link386

NAME mfread WINDOWCOMPAT

DESCRIPTION 'MIDI to Text Converter'

CODE	MOVEABLE
DATA	MOVEABLE MULTIPLE

HEAPSIZE  8192
STACKSIZE 16384
