;******* PGMNUM.EXE Program Module Definition File (.DEF) ********
; The module definition file supplies extra information about the program module to the LINKER.
; Note the WINDOWCOMPAT keyword is required for link386

NAME PGMNUM WINDOWCOMPAT

DESCRIPTION 'Display GM Patch name for a given program number.'

CODE   MOVEABLE
DATA	MOVEABLE MULTIPLE

HEAPSIZE   8192
STACKSIZE 16384
