NAME	DMSAMP1      WINDOWAPI

DESCRIPTION 'IBMCLASS C++ Drag Test program'

CODE	LOADONCALL MOVEABLE
DATA	MOVEABLE   MULTIPLE

HEAPSIZE  8192
STACKSIZE 65536

