; You have to supply a DEF file to build a DLL, but since the exports
; in our DLLs are all handled by the source-language _Export keyword
; we can use a generic DEF file to build all of ours.  No need to list
; the exported symbols here.

LIBRARY INITINSTANCE
DATA MULTIPLE NONSHARED
