;/*****************************************************************************/
;/*                                                                           */
;/*  CPPOS30.DLL definitions file                                             */
;/*                                                                           */
;/*  Licensed Materials - Property of IBM                                     */
;/*                                                                           */
;/*  IBM C/C++ Tools Version 3.0                                              */
;/*  (C) Copyright International Business Machines Corp., 1991,1995           */
;/*  All rights reserved                                                      */
;/*                                                                           */
;/*  US Government Users Restricted Rights -                                  */
;/*  Use, duplication, or disclosure restricted                               */
;/*  by GSA ADP Schedule Contract with IBM Corp.                              */
;/*                                                                           */
;/*****************************************************************************/

LIBRARY CPPOS30 INITINSTANCE TERMINSTANCE
PROTMODE
DATA MULTIPLE NONSHARED READWRITE LOADONCALL
CODE LOADONCALL
STUB 'COPYV3R0.EXE'
EXPORTS
   _dump_allocated_delta
   __dump_allocated_delta
   _tdump_allocated_delta
   __tdump_allocated_delta
   _udump_allocated_delta
   __udump_allocated_delta
   _heapchk
   _heapset
   _heap_walk
   _uheapchk
   _uheapset
   _uheap_walk
   _reg_heap
   _ucalloc
   _umalloc
   _udefault
   _ucreate
   _uaddmem
   _uheapmin
   _uheap_check
   __uheap_check
   _udestroy
   _theapmin
   _debug_ucalloc
   _debug_umalloc
   _debug_uheapmin
   _debug_tfree
   _debug_tmalloc
   _debug_theapmin
   _debug_tcalloc
   _debug_trealloc
   _theap_check
   _tdump_allocated
   __tdump_allocated
   _udump_allocated
   __udump_allocated
   _ustats
   _mheap
   _uopen
   _uclose
   _PGLOBAL_PTR
   _cputsused                                 ; 16 bit function
   _critlib_except                            ; ****
   _ctype
   _daylight
   _DosSelToFlat                              ; **** ; 16 bit function
   _DosFlatToSel                              ; **** ; 16 bit function
   _doserrno
   _environ                                   ; ****
   _fullDump
   __fac                                      ; 16 bit function
   _getcheused                                ; 16 bit function
   _ilog2
   _InitBuf
   _osmajor
   _osminor
   _osmode
   _timezone
   _tzname
   _ungetchused                               ; 16 bit function
   _version
   errno
   stderr
   stdin
   stdout
   _callback_opt_sys
   _CRT_init                                  ; ****
   _CRT_term                                  ; ****
   _CheckIfMem
   _EXE_Exception                             ; ****
   _Exception                                 ; ****
   _Flush
   _Fmprs
   _GetErrMsg
   _Lib_excpt
   _PrintErrMsg                               ; ****
   __EDC3216                                  ; 16 bit function
   __EDCThunkProlog                           ; 16 bit function
   __dofmto
   __goscan
   _assert
   _atofieee
   _atold
   _clear87
   _control87
   __cputs                                    ; 16 bit function
   _ddused
   _debug_calloc
   _debug_free
   _debug_malloc
   _debug_realloc
   _debug_heapmin
   _dposqnan
   _dump_allocated
   __dump_allocated
   _ecvt
   _erf
   _erfc
   _exception_procinit                        ; ****
   _exception_dllinit                         ; ****
   _fcloseall
   _fcvt
   _fltused
   _fopenused
   _fpninit
   _fposqnan
   _fposinfi
   _fpreset
   _fprintf_ansi
   _fprintfieee
   _freemod
   _FreeFCB
   _fscanf_ansi
   _fscanfieee
   _fullpath
   _gamma
   _gcvt
   __getche                                   ; 16 bit function
   _getcx
   _heap_check
   __heap_check
   _heapmin
   _hypot
   _infinity
   _InitFCB
   _internal_err
   _itoa
   _j0
   _j1
   _jn
   _ldposqnan
   _ldposinfi
   _LHUGE_VAL
   _loadmod
   _ltoa
   _matherr                                   ; ****
   _MemoryFileUsed
   _mig_eib_store
   _msize
   _printf_ansi
   _printfieee
   _ProfileHook16
   _ProfileHook32
   _ProfileThrow32
   _ProfileUnwind32
   _ProfileHookVAOptlink32
   _putenv
   _ipmd_heap_check
   _rmtmp
   _set_crt_msg_handle
   _scanf_ansi
   _scanfieee
   _sprintf_ansi
   _sprintfieee
   _sscanf_ansi
   _sscanfieee
   _status87
   _strtodieee
   _terminate                                 ; ****
   _test_handle
   _tzset
   _ultoa
   __ungetch                                  ; 16 bit function
   _vfprintfieee
   _vprintfieee
   _vsprintfieee
   _y0
   _y1
   _yn
   abort
   abs
   acos
   asctime
   asin
   atan
   atan2
   atexit
   atof
   atoi
   atol
   bsearch
   calloc
   ceil
   clearerr
   clock
   cos
   cosh
   ctime
   difftime
   div
   exit                                       ; ****
   exp
   fabs
   fclose
   feof
   ferror
   fflush
   fgetc
   fgetpos
   fgets
   floor
   fmod
   fopen
   fprintf
   fputc
   fputs
   fread
   free                                       ; ****
   freopen
   frexp
   fscanf
   fseek
   fsetpos
   ftell
   fwrite
   getc
   getchar
   getenv
   gets
   gmtime
   isalnum
   isalpha
   iscntrl
   isdigit
   isgraph
   islower
   isprint
   ispunct
   isspace
   isupper
   isxdigit
   labs
   ldexp
   ldiv
   localeconv
   localtime
   log
   log10
   longjmp
   malloc                                     ; ****
   mblen
   mbstowcs
   mbtowc
   memccpy
   memchr
   memcmp
   memcpy
   memicmp
   memmove
   memset
   mktime
   modf
   perror
   pow
   printf
   putc
   putchar
   puts
   qsort
   raise
   rand
   realloc
   remove
   rename
   rewind
   scanf
   setbuf
   setjmp
   setlocale
   setvbuf
   signal
   sin
   sinh
   sprintf
   sqrt
   srand
   sscanf
   strcat
   strchr
   strcmp
   strcoll
   strcpy
   strcspn
   strdup                                     ; ****
   strerror
   strftime
   stricmp
   strlen
   strlwr
   strncat
   strncmp
   strncpy
   strnicmp
   strpbrk                                    ; ****
   strrchr
   strspn
   strstr
   strtod
   strtok
   strtold
   strtol
   strtoul
   strupr
   strxfrm
   system
   tan
   tanh
   time
   tmpfile
   tmpnam
   tolower
   toupper
   ungetc
   vfprintf
   vprintf
   vsprintf
   wcscat
   wcschr
   wcscmp
   wcscpy
   wcscspn
   wcslen
   wcsncat
   wcsncmp
   wcsncpy
   wcspbrk
   wcsrchr
   wcsspn
   wcstombs
   wcswcs
   wctomb
   _chdrive
   _execl_ansi
   _execle_ansi
   _execlp_ansi
   _execlpe_ansi
   _exit
   _getdcwd
   _getdrive
   _makepath
   _searchenv
   _spawnl_ansi
   _spawnle_ansi
   _spawnlp_ansi
   _spawnlpe_ansi
   _splitpath
   _strdate
   _strerror
   _strtime
   _tcalloc
   _tfree
   _tmalloc
   _trealloc
   _access
   _cabs
   _cgets                                     ; 16 bit function
   _chdir
   _chmod
   _chsize
   _close
   _cprintf                                   ; 16 bit function
   _cputs                                     ; 16 bit function
   _creat
   _cscanf                                    ; 16 bit function
   _cwait
   _dup
   _dup2
   __eof
   _execl
   _execle
   _execlp
   _execlpe
   _execv
   _execve
   _execvp
   _execvpe
   _fdopen
   _fgetchar
   _filelength
   _fileno
   _flushall
   _fputchar
   _fstat
   _ftime
   _getch                                     ; 16 bit function
   _getche                                    ; 16 bit function
   _getcwd
   _getpid
   _isatty
   _kbhit                                     ; 16 bit function
   _lfind
   _lsearch
   _lseek
   _mkdir
   _onexit
   _open
   _putch                                     ; 16 bit function
   _read
   _rmdir
   _setmode
   _sopen
   _spawnl
   _spawnle
   _spawnlp
   _spawnlpe
   _spawnv
   _spawnve
   _spawnvp
   _spawnvpe
   _stat
   strcmpi
   strnset
   strrev
   strset
   _swab
   _tell
   _tempnam
   _umask
   _ungetch                                   ; 16 bit function
   _unlink
   _utime
   _wait
   _write
   ; posix locale
   _ctype_loweridx
   _ctype_lower
   _ctype_upperidx
   _ctype_upper
   _ctype_ctypeidx
   _ctype_cmask
   _ctype_mask
   _mb_cur_max
   isblank
   nl_langinfo
   getsyntx
   iswalnum
   iswalpha
   iswblank
   iswcntrl
   iswdigit
   iswgraph
   iswlower
   iswprint
   iswpunct
   iswspace
   iswupper
   iswxdigit
   wctype
   iswctype
   towupper
   towlower
   wctob
   mbsinit
   mbrlen
   mbrtowc
   mbsrtowcs
   wcrtomb
   wcsrtombs
   wcstod
   wcstol
   wcstoul
   wcsstr
   wcstok
   wcscoll
   wcsxfrm
   wcswidth
   wcwidth
   strptime
   wcsftime
   _vswprintfieee
   vswprintf
   _swprintf_ansi
   _swprintfieee
   _swscanf_ansi
   _swscanfieee
   regcomp
   regexec
   regfree
   regerror
   fgetwc
   fgetws
   fputwc
   fputws
   getwc
   getwchar
   putwc
   putwchar
   ungetwc
   _rpmatch
   strfmon
   _csid
   _wcsid
   ismccollel
   strtocoll
   colltostr
   collequiv
   collrange
   collorder
   cclass
   maxcoll
   getmccoll
   getwmccoll
   localdtconv
   iconv_open
   iconv
   iconv_close

; C++ exports
   __dl__FPv
   __dl__FPvPCcUi
;
   __nw__FUi
   __nw__FUiPv
   __nw__FUiPCcT1
   __nw__FUiPCcT1Pv
;
   __vec__assign
   __vec__copy
   __vec__debug__delete2
   __vec__delete2
   __vec__new2
   __vec__new__place
;
   __CatchMatch
   __CleanupCatch
   __CurrentException
   __get_frame_ptr
   __Invoke__Delete
   __Invoke__Destructor
   __PureVirtualCalled
   __RestoreRegsAndJump
   __ReThrow
   __set_frame_ptr
   __Throw
;
   set_new_handler__FPFv_v
   set_terminate__FPFv_v
   set_unexpected__FPFv_v
   terminate__Fv
   unexpected__Fv
;
   __compute_embedded
   __deleteSomObject
   __wDestructSOMBase
   __dl__FP9SOMObject
   __dl__FP9SOMObjectPCcUi
   __nw__FP8SOMClassUi
   __nw__FP8SOMClassUiPv
   __nw__FP8SOMClassUiPCcT2
   __nw__FP8SOMClassUiPCcT2Pv
   __setup_embedded
   __SOMEnv
   __vec__copy__som
   __vec__new__place__som
   __vec__new__som
      __ct__13Iostream_initFv
      stdstatus__13Iostream_init
      cout
      clog
      initcount__13Iostream_init
      cin
      __dt__13Iostream_initFv
      cerr
      get_complicated__7istreamFRUc
      eatwhite__7istreamFv
      putback__7istreamFc
      xget__7istreamFPc
      rs_complicated__7istreamFRSc
      __rs__7istreamFPUc
      __rs__7istreamFPc
      get_complicated__7istreamFRc
      get_complicated__7istreamFRSc
      __rs__7istreamFPSc
      rs_complicated__7istreamFRc
      rs_complicated__7istreamFRUc
      __ls__7ostreamFPCv
      __ls__7ostreamFPCSc
      ls_complicated__7ostreamFUc
      __ls__7ostreamFi
      __ls__7ostreamFP9streambuf
      ls_complicated__7ostreamFc
      __ls__7ostreamFl
      __ls__7ostreamFUi
      __ls__7ostreamFPCc
      ls_complicated__7ostreamFSc
      __ls__7ostreamFPCUc
      __ls__7ostreamFUl
      complicated_put__7ostreamFc
      endl__FR7ostream
      __ls__7ostreamFPFR3ios_R3ios
      ws__FR7istream
      resetiosflags__Fl
      setw__Fi
      flush__FR7ostream
      dec__FR3ios
      setfill__Fi
      setprecision__Fi
      hex__FR3ios
      oct__FR3ios
      __rs__7istreamFPFR3ios_R3ios
      setiosflags__Fl
      ends__FR7ostream
      setbase__Fi
      inf_special_in__7istreamFP9streambuf
      nan_special_in__7istreamFP9streambuf
      __rs__7istreamFRr
      __rs__7istreamFRd
      __rs__7istreamFRf
      __vft7ostream3ios_10ostrstream
      __vft7ostream3ios_9strstream8iostream
      __ct__10ostrstreamFPSciT2
      pcount__10ostrstreamFv
      __ct__10istrstreamFPCc
      __vft9strstream3ios
      __vft13strstreambase3ios
      __vft10ostrstream3ios
      __ct__10istrstreamFPCSc
      __ct__12strstreambufFPUciT1
      __vtt13strstreambase
      __vft13strstreambase3ios_9strstream
      __vft13strstreambase
      __ct__13strstreambaseFPciT1
      __ct__12strstreambufFi
      __ct__10istrstreamFPCci
      __ct__10istrstreamFPCUci
      __ct__12strstreambufFv
      __ct__10istrstreamFPc
      __vft10istrstream3ios
      __ct__10istrstreamFPSc
      freeze__12strstreambufFi
      __vtt9strstream
      __vft8iostream3ios_9strstream
      __vft7istream3ios_9strstream8iostream
      __ct__10istrstreamFPSci
      __ct__13strstreambaseFv
      str__9strstreamFv
      str__10ostrstreamFv
      __vft12strstreambuf9streambuf
      __ct__9strstreamFPciT2
      __ct__9strstreamFPUciT2
      __ct__10istrstreamFPCUc
      init__12strstreambufFPciT1
      __vtt10istrstream
      __vft7istream3ios_10istrstream
      __vft13strstreambase3ios_10ostrstream
      __ct__12strstreambufFPFl_PvPFPv_v
      __ct__10ostrstreamFv
      __ct__10ostrstreamFPciT2
      __ct__10ostrstreamFPUciT2
      __ct__10istrstreamFPUc
      __ct__12strstreambufFPciT1
      __vtt10ostrstream
      __vft13strstreambase3ios_10istrstream
      __ct__12strstreambufFPSciT1
      __ct__10istrstreamFPci
      __ct__10istrstreamFPUci
      __ct__10istrstreamFPCSci
      str__12strstreambufFv
      rdbuf__13strstreambaseFv
      pcount__12strstreambufFv
      __ct__9strstreamFv
      __ct__9strstreamFPSciT2
      setbuf__12strstreambufFPci
      __dt__12strstreambufFv
      overflow__12strstreambufFi
      underflow__12strstreambufFv
      __dt__13strstreambaseFv
      __dt__10ostrstreamFv
      __dt__9strstreamFv
      seekoff__12strstreambufFlQ2_3ios8seek_diri
      doallocate__12strstreambufFv
      __dt__10istrstreamFv
      getline__7istreamFPScic
      ignore__7istreamFiT1
      __rs__7istreamFP9streambuf
      get__7istreamFPcic
      getline__7istreamFPcic
      get__7istreamFPUcic
      get__7istreamFR9streambufc
      getline__7istreamFPUcic
      read__7istreamFPci
      gcount__7istreamFv
      get__7istreamFPScic
      __rs__7istreamFRl
      __rs__7istreamFRUi
      __rs__7istreamFRs
      __rs__7istreamFRUl
      __rs__7istreamFRi
      __rs__7istreamFRUs
      __ct__8stdiobufFP6__file
      rdbuf__11stdiostreamFv
      __ct__11stdiostreamFP6__file
      __vft11stdiostream3ios
      __vft8stdiobuf9streambuf
      overflow__8stdiobufFi
      seekoff__8stdiobufFlQ2_3ios8seek_diri
      __dt__11stdiostreamFv
      pbackfail__8stdiobufFi
      __dt__8stdiobufFv
      underflow__8stdiobufFv
      sync__8stdiobufFv
      setbuf__9streambufFPUci
      __ct__9streambufFv
      __ct__9streambufFPci
      x_snextc__9streambufFv
      __vft9streambuf
      xsgetn__9streambufFPci
      sync__9streambufFv
      seekpos__9streambufFli
      doallocate__9streambufFv
      seekoff__9streambufFlQ2_3ios8seek_diri
      xsputn__9streambufFPCci
      setbuf__9streambufFPci
      pbackfail__9streambufFi
      overflow__9streambufFi
      __dt__9streambufFv
      underflow__9streambufFv
      last_op__7filebufFv
      open__7filebufFPCciT2
      __ct__7filebufFi
      openprot__7filebuf
      attach__7filebufFi
      detach__7filebufFv
      close__7filebufFv
      __ct__7filebufFiPcT1
      __ct__7filebufFv
      __vft7filebuf9streambuf
      seekoff__7filebufFlQ2_3ios8seek_diri
      overflow__7filebufFi
      __dt__7filebufFv
      setbuf__7filebufFPci
      underflow__7filebufFv
      sync__7filebufFv
      str__FPCci
      oct__Fli
      hex__Fli
      dec__Fli
      __ct__7istreamFP9streambufiP7ostream
      setbuf__9streambufFPciT2
      __ct__7ostreamFiPc
      __ct__7istreamFiT1P7ostream
      __ct__9streambufFPciT2
      WS__FR7istream
      form__FPCce
      __ct__7istreamFiPcT1
      chr__FiT1
      skip__3iosFi
      eatwhite__FR7istream
      __ct__7ostreamFi
      dbp__9streambufFv
      sync_with_stdio__3iosFv
      _is_fd_open__Fi
      _MAKE_LDBL_POSITIVE
      _INF_LEN
      _IEEE_DBL_ALL_EXP_MASK
      _IEEE_LDBL_INF_MASK
      _LC_INFINITY_STR
      _LC_INF_STR
      _NAN_STR
      _MAKE_DBL_POSITIVE
      _LC_NAN_STR
      _NAN_LEN
      _INFINITY_LEN
      _IEEE_DBL_SIGN_NEG_MASK
      _IEEE_DBL_INF_MASK
      _INFINITY_STR
      _INF_STR
      _IEEE_LDBL_SIGN_NEG_MASK
      _IEEE_LDBL_ALL_EXP_MASK
      __ls__7ostreamFd
      __ls__7ostreamFr
      __ls__7ostreamFf
      __rs__7istreamFRw
      __rs__7istreamFPw
      get__7istreamFRw
      __ls__7ostreamFPCw
      wchar_out__7ostreamFiPcT1
      __ls__7ostreamFw
      __ct__8ifstreamFiPcT1
      __vtt7fstream
      __vft7ostream3ios_7fstream8iostream
      __vft11fstreambase3ios_7fstream
      open__11fstreambaseFPCciT2
      __ct__7fstreamFPCciT2
      __vft8ofstream3ios
      __vft7fstream3ios
      __ct__11fstreambaseFi
      __vtt8ofstream
      __vft8iostream3ios_7fstream
      __vft11fstreambase3ios_8ifstream
      __ct__7fstreamFiPcT1
      __ct__7fstreamFi
      __ct__11fstreambaseFPCciT2
      detach__11fstreambaseFv
      close__11fstreambaseFv
      __ct__8ofstreamFv
      __ct__11fstreambaseFiPcT1
      setbuf__11fstreambaseFPci
      __vft7istream3ios_8ifstream
      __vft11fstreambase3ios_8ofstream
      __ct__8ofstreamFiPcT1
      __ct__8ifstreamFv
      open__8ofstreamFPCciT2
      verify__11fstreambaseFi
      attach__11fstreambaseFi
      __vft7ostream3ios_8ofstream
      __vft7istream3ios_7fstream8iostream
      __ct__8ofstreamFi
      open__8ifstreamFPCciT2
      __ct__8ofstreamFPCciT2
      __vft11fstreambase3ios
      __vft8ifstream3ios
      __ct__8ifstreamFi
      __vtt8ifstream
      __vtt11fstreambase
      __vft11fstreambase
      __ct__11fstreambaseFv
      open__7fstreamFPCciT2
      __ct__8ifstreamFPCciT2
      __ct__7fstreamFv
      __dt__8ofstreamFv
      __dt__7fstreamFv
      __dt__8ifstreamFv
      __dt__11fstreambaseFv
      unsetf__3iosFl
      do_ipfx__7istreamFi
      pword__3iosFi
      __as__18ostream_withassignFR7ostream
      __ct__3iosFP9streambuf
      xalloc__3iosFv
      __ct__8iostreamFP9streambuf
      __ct__7ostreamFP9streambuf
      __ct__7istreamFv
      basefield__3ios
      __vft8iostream3ios
      flags__3iosFl
      precision__3iosFi
      __vtt8iostream
      __vtt7ostream
      __vft7ostream3ios_8iostream
      __vft7istream
      init__3iosFP9streambuf
      do_osfx__7ostreamFv
      __vtt19iostream_withassign
      __vtt18istream_withassign
      __ct__8iostreamFv
      __ct__3iosFv
      __ct__19iostream_withassignFv
      __as__18istream_withassignFP9streambuf
      __as__19iostream_withassignFR3ios
      stdioflush__3ios
      nextword__3ios
      floatfield__3ios
      __vft7ostream3ios
      __vft19iostream_withassign3ios
      __vft18ostream_withassign3ios
      seekp__7ostreamFl
      setf__3iosFl
      setf__3iosFlT1
      __vft7istream3ios_8iostream
      __vft7istream3ios_19iostream_withassign8iostream
      __ct__7ostreamFv
      tellg__7istreamFv
      flush__7ostreamFv
      __vft8iostream3ios_19iostream_withassign
      __vft7ostream3ios_18ostream_withassign
      __vft7istream3ios_18istream_withassign
      __ct__18istream_withassignFv
      fill__3iosFc
      adjustfield__3ios
      __vft3ios
      __ct__3iosFR3ios
      __as__18istream_withassignFR7istream
      uresize__3iosFi
      iword__3iosFi
      __vft7ostream
      __ct__7istreamFP9streambuf
      __vtt18ostream_withassign
      __as__3iosFR3ios
      nextbit__3ios
      seekg__7istreamFl
      tie__3iosFP7ostream
      __vtt7istream
      __vft7ostream3ios_19iostream_withassign8iostream
      tellp__7ostreamFv
      seekp__7ostreamFlQ2_3ios8seek_dir
      seekg__7istreamFlQ2_3ios8seek_dir
      do_opfx__7ostreamFv
      bitalloc__3iosFv
      __ct__18ostream_withassignFv
      __as__19iostream_withassignFP9streambuf
      __as__18ostream_withassignFP9streambuf
      __vft7istream3ios
      __vft18istream_withassign3ios
      __dt__3iosFv
      __dt__19iostream_withassignFv
      __dt__7istreamFv
      __dt__8iostreamFv
      __dt__7ostreamFv
      __dt__18ostream_withassignFv
      __dt__18istream_withassignFv
