    NAME           GPIDEMO      WINDOWAPI

    DESCRIPTION    'Combines most of the GPI example programs into one'
    PROTMODE
    HEAPSIZE       1024
    STACKSIZE      8192
    EXPORTS        BasClientWndProc
                   BasClientWndProc1

