;=========================================================================;
; HugeLB.DEF module definition file                                      ;
;=========================================================================;

NAME           HugeLB   WINDOWAPI

DESCRIPTION    'PM Owner-Draw Listbox sample'
PROTMODE
HEAPSIZE       1024
STACKSIZE      8192
