;******* DRAGINFO C Sample Program Module Definition File (.DEF) ********
;
;  The module definition file supplies extra information about the program
;  module to the LINKER.
;
;  Different HEAPSIZE used. ( 1024 bytes )


NAME    draginfo WINDOWAPI

DESCRIPTION 'drag&drop testprogram'

STUB    'OS2STUB.EXE'

CODE    MOVEABLE
DATA    MOVEABLE MULTIPLE

HEAPSIZE   18192
STACKSIZE  20384
EXPORTS    MyWindowProc
           wpFileList
           ObjectWinProc

PROTMODE


