;******* RX.EXE Program Module Definition File (.DEF) ********
; The module definition file supplies extra information about the program module to the LINKER.
; Note the WINDOWAPI keyword is required for link386

NAME RX2 WINDOWAPI

DESCRIPTION 'Rexx Dialog Launcher'

CODE LOADONCALL MOVEABLE
DATA  MOVEABLE MULTIPLE

HEAPSIZE   8192
STACKSIZE 16384
