5                           Calling the SysOp

1        1. 2[General Functions] 1Return to the General Functions menu

7 Users may press an 2L7 to page the SysOp for an online chat in real
7 time. SysOps normally are available only during certain hours to chat
7 with users. If the SysOp is not present or busy when you page him, you 
7 will be informed of this. If available, the SysOp will be paged by a
7 siren-type sound to call his attention. Please allow a few seconds for
7 the SysOp to respond to a chat request. Users should not repeatedly
7 page the SysOp when he is not responding since this is impolite and can
7 can be quite annoying.

7 If the SysOp is not available to chat with you, please feel free to
7 to press F7 to leave a feedback note to him.
