RESET POINT SELECT

This PBI allows you to select the "reset point", which contains the set of initial conditions for your approach.  These conditions include landing site, altitude, approach geometry, etc.  A particular reset is selected by pressing the up/down arrow keys until the desired reset point is highlighted.  You may also create your own resets via this PBI by editing an existing reset and storing it in a different slot, or you can create one during a run at any point you choose.  A reset point must be selected before an approach run may begin.  After selecting a reset point, press the GO PBI to start the run.  Once a reset point has been selected, it remains the default selection until a different one is specified via this PBI.