ALW Softwar e License Registration

Return this form to:

Distributed Systems Section, CFB, DCRT Bldg. 12A, Room 2033 National Institutes of Health Bethesda, MD 20892

Please use this form in order to register an ALW machine to use a centrally maintained copy of software licensed to run only on specific machines. Proof of purchase of a license for the machine must be attached to this form, either an NIH Purchase Order or Record of Call. For more information on completing these forms, please call 496-UNIX.

Software Information:

Name of Software: ____________________________________________________________________ Software Version: _____________________________________________________________________ Machine Serial Number: _______________________________________________________________ Host ID (output of hostid command): ___________________________________________________ Host Name (output of hostname command): ______________________________________________ Purchase Order or Record of Call # (attach copy): _____________________ Item #:_________________ License Key (if applicable): _____________________________________________________________

NIH ALW Software License Registration Form (9/93)