ALW Storage Gr oup Registration

Return this form to: DCRT Account No.

Project Control Office, DCRT Bldg. 12A, Room 1017 National Institutes of Health Bethesda, MD 20892

In order to register for an ALW storage group, you must be registered to a DCRT Account for billing purposes. If you are currently registered: 1) Please indicate the account number above, 2) complete the storage group information section below, and 3) have the sponsor of that account sign below authorizing this request. If you are not currently registered to a DCRT account, please complete form NIH 1767-1 and then proceed with the completion of this registration form. For more information on completing these forms, please call the Project Control Office on 301-496-6146.

User Information (Contact Person):

Name (Please print): ______________________________________ Institute:_____________________

NIH Address: __________________________________________Telephone:_____________________

ALW Username: ______________________________________________________________________

Group Information:

* Preferred Storage Group Name: __________________________________________________________

** Second choice:________________________________________ Third choice:_____________________

* The name is used as part of the volume name for the storage you will be allocated. It may have up to 10 uppercase alphabetic characters.

** Please specify second and third choices in case first choice is unavailable.

Authorization:

DCRT Account Sponsor’s Name (Please print): _____________________________________________

____________________________________________________________________________________ DCRT Account Sponsor’s Signature DATE

DO NOT WRITE BELOW THIS LINE

ALW Storage Gr oup Notification

ALW Storage Group Name: _____________________________________________________________

You may now use this name to request ALW volumes by submitting a PTR. Requests must be made by the contact person specified above. Please include the requested allocation (in MBs). The format of volume names is g.AAA.xxx, where AAA is the name assigned here and xxx signifies other name fields which you may use to further qualify the name. For example, if your storage group is named ABC, you might request volumes g.ABC.images.01, g.ABC.images.02, etc.

NIH ALW Storage Group Registration Form (9/93)