Copyright: ® Mod-Tap
Citation: ® Mod-Tap


PassPort Wall Plate Family
MOD-TAP PassPort Wall Plate Family

PassPort is an affordable family of feature-rich modules and wall plates designed to provide a sleek, coordinated appearance in the contemporary office environment.

•	Available in either PowerCat or Category 5 or 4 modules

•	Sleek new look well suited to the contemporary office environment

•	Category 5 compliant - protects high speed data

•	High density - up to six channels in a single gang plate so fewer locations are cabled

•	Angled modules for improved bend radius at the wall plate

•	Expanded labeling for today's well documented cabling system

•	Snap in labels for easy channel marking

•	Integral flush fiber plate - low profile provides an elegant solution to Optical Fiber To the Desk (OFTD®)

•	Matching duplex and switch plates for a coordinated office appearance

•	Wall plates and modules are available in four NEMA colors:  electrical ivory, white, black, and dark grey

•	Duplex compatible  mount up to four jacks anywhere a duplex outlet is used (modular furniture, power poles, floor boxes, etc.)

•	One- and Two-Channel Factory-Configured Wall Plates are very affordable, with labeling and icon options not found on competitive products

The key to the PassPort family is the module. PassPort Modules are available in straight-through and angled versions, one and two channels, Categories 4 and 5, 568A and 568B, USOC, dual SC or ST®, BNC, video F & S, and blanks. The modules are available in five NEMA colors that match the wall plates:  electrical ivory, black, white, and dark grey,.

PassPort Wall Plates come in one and two-channel factory-configured versions, single and double gang field-configurable versions, electrical duplex and switch plates, and a unique optical fiber plate. The high density, field-configurable modular plates allow the user to custom configure them on site. MOD-TAP has provided for a seamless appearance in the office by including matching electrical duplex and switch plates. All of the wall plates are sized to compensate for uneven openings in the wallboard.

Expanded Labeling Options

PassPort features two-way labeling - paramount in today's well documented cabling system. PassPort has provisions for both channel identification as well as outlet identification. Channel identification is accomplished via color matched snap-in plastic labels that are pre-printed with alphanumeric symbols or with a variety of communications icons. They can be inserted for either horizontal or vertical orientation.

For outlet identification, use either MOD-TAP Uni-Labels or clear screw covers. The Uni-Labels fit all of the wall plates, including the switch and duplex plates. The clear screw covers fit the configurable wall plates. Both label holders accept 12mm commercial labels for a neat, professional appearance.


Dtype Connector
MOD-TAP Dtype Connector

One of the more common data communications interfaces is the 25 pin Dtype connector.  Of the (up to) 25 pins on equipment, few carry active signals. Normally, eight pins or less are functionally required. This allows the use of easy to handle, cost effective adapters and line cords.  Dtype adapters are available in 9 or 25 pin male or female versions.

MOD-TAP offers  Dtype Adapters un-wired in individually-packaged kits for field assembly or pre-wired in standard or custom configurations.  Please see the following pages for options and ordering information.

Adapter Kits include:

•	Slate (grey) shells with no logo

•	Set of mounting screws

•	Modular jack with flying leads (Dtype contacts crimped on)

•	D sub-miniature connector

25 Pin Dtype Kits

06-888-999-00	WE8W 	Male

06-988-999-00	WE8W 	Female

9 Pin Dtype Kits

08-888-999-00	WE8W 	Male

08-988-999-00	WE8W 	Female


USO Surface Blocks
MOD-TAP USO Surface Blocks

Surface blocks are ideal for use where a surface mount is needed in a confined space.

The One Module Surface Block requires a total of two part numbers:

•	One Block (housing)

•	One Single High USO Module

The Two Module Surface Block requires a total of three part numbers:

•	One Block

•	Two Single High USO Modules

17.B142*	One-Module Surface Block
17-5206-0*	Two-Module Surface Block
35.B0120	Magnet for mounting 17.B142*
35-701	Magnets for mounting 17-5206-0*
Replace (*) with the following USO Color Code:

1=Almond

2=White

4-Black

8=Light Gray


Ring Run Panels

Ring Runs neatly organize patch cords on the front side of patching fields. Black rings are mounted on a graphite grey panel.

The 1 Position Ring Run has five small rings for small to medium cable dressing requirements.

The 2 Position Ring Run is recommended for larger Category 5 UTP cables or for areas with a higher density of cables.

The 1 Position Deep Ring Run features deep rings which provide the same capacity as the 2 Position Rings in one rack position.

The Cable Management Panel is easily accessible for day-to-day moves and changes and a snap-on cover provides a neat, uncluttered appearance.

The 2 Position Double Density Ring Run features double-deep 2 Position Rings for optimum cable capacity.

The 2 Position Double Sided Ring Run provides high density cable management on the front and back of the rack in one easy to install panel.

25.B016G	1 Position Ring Run
25.B013G	2 Position Ring Run
25.B035G	1 Position Deep Ring Run
25.C001G	Cable Management Panel
25.B058G	2 Position Double Density Ring Run
25.B059G	2 Position Front and Rear Ring Run


BTR Cable Management Rings

MOD-TAP's Between the Rack Cable Management Ring mounts between 19" open bay racks and provides front and back vertical cable management between rack groupings. Each ring will manage approximately 600 cables. Includes mounting screws. MOD-TAP recommends using at least three rings between racks.

Part No.	Description
25.B0434	BRT Cable Management Ring
35.B0230	12-Inch Cable Management Straps (25/bag)
35.B0240	18-Inch Cable Management Straps (25/bag)
35.B0270	8-Inch Cable Management Straps (25/bag)


1 and 2 Position Horizontal/Vertical Ring Runs

Horizontal/Vertical Ring Runs integrate horizontal and vertical cable management, eliminating the need to mount single rings down the edge of a rack. All are constructed of black rings on a graphite grey panel.

The 1 Position Horizontal/Vertical Ring Run is designed for cross connect wire or a small amount of UTP cable.

The 1 Position Deep Horizontal/Vertical Ring Run is built with deep rings to handle the same volume of cable as the 2 Position in half the rack space.

The 2 Position Horizontal/Vertical Ring Run accepts twice the horizontal cable as the 1 Position panel for a high-density patch field or Category 5 UTP cables.

Part No.	Description
25.B033G	1 Position Horizontal/Vertical Ring Run
25.B034G	1 Position Deep Horizontal/Vertical Ring
25.B032G	2 Position Horizontal/Vertical Ring Run


24 Port FMS Termination Drawer
MOD-TAP 24 Port FMS Termination Drawer

The 24 Port FMS Termination Drawer is a 1U configurable rack mount unit for storing and terminating incoming fiber cable. The cabinet is made of rugged 16 gauge steel with a graphite grey powdercoat finish. The front of the drawer slides open to reveal a recessed configurable patch panel that accepts up to four 6-Pak/Adapter plates. Behind the configurable panel is a fully enclosed cable management area. The 24 Port FMS comes with a keyed lock, to provide a compact, secure termination drawer, and includes rack mounting screws, cable management ring, labeling, and split tubing to protect the incoming cable.

17.B155G	24 Port FMS Termination Drawer


2 Position High Density Ring Run
MOD-TAP 2 Position High Density Ring Run

The 2 Position High Density Ring Run provides horizontal and vertical cable management, as well as more precise routing of individual cables for cross connect wire for a well-organized patching field.

25.B031G	2 Position High Density Ring Run


601-Series
MOD-TAP 601-Series

MOD-TAP 601-Series wall mount system interface products are compact units for optical fiber or a mix of fiber and twisted pair channels. The 601-Series products have the capacity for up to six fibers terminated with ST® or SC type connectors.

The 601 interface units are made of rugged grey plastic and have a low profile, yet provide the proper internal fiber management to ensure the integrity of the optical network. Sufficient storage room for the fiber service loop makes installation easy. There is also provision for a user-supplied seal for added security.

The 601 unit includes adapter plate, wire ties, designation strip and foam strip for protecting incoming cable. The 601STL and 601SCL include couplers.

15.B0220	601ST - Up to 6 ST® terminated fibers - couplers not included
15.B0230	601STL - Up to 6 ST® terminated fibers - MM couplers included
15.B0260	601SCL - Up to 6 SC terminated fibers - MM couplers included
15.B0250	601SC - Up to 6 SC terminated fibers - couplers not included


Accessories
MOD-TAP Accessories

Part No.	Description
25-222	Mod Strut Mounting Kit
25.B011G	Two Position Equipment Shelf
25.B008G	Heavy Duty Equipment Rack
25.B018G	1 Position Blank Panel
25.B019G	2 Position Blank Panel
25.B020G	4 Position Blank Panel
25-206	Rear Mount Strain Relief
IDC Punch Down Tools

The MOD-TAP Punch Down Tool provides a reliable connection at a reasonable cost. It is entirely compatible with KATT, 110, and Krone connectors. Its low-impact form prevents damage to connectors. The "Scissors" style cut-off gives positive wire trimming, even on older blocks.

The IDC Punch Down Tool is an industry standard tool used for terminating individual conductors onto 110 and KATT connectors.

KATT Loading Tool

The KATT Loading Tool is used for loading KATT connectors onto 100 pair bases. This inexpensive, no-impact tool is durable and contains no moving parts.

Part No.	Description
14-0400-001	MOD-TAP Punch Down Tool
31-001	IDC Punchdown Tool with 110 blade
31-001-1	110 Replacement Blade for both Tools
14-0401-001	KATT Loading Tool


Screened Twisted Pair
MOD-TAP Screened Twisted Pair

Screened cabling systems are becoming popular in most European countries today, and are even required in some countries. The following products are currently available for use in the Americas.

MOD-TAP will offer a complete screened solution for the Americas market when the standard becomes clearly defined by the TIA PN3193 100 Ohm Screened Twisted Pair Subcommittee.

ScTP Panels are available for EMI hostile environments. MOD-TAP offers 24 and 48 port panels with integral cable management on the front and rear. These panels have been manufactured with the installer in mind; ease of termination and ease of use are paramount concerns. 360 Degree shield termination provides the transfer impedance necessary for maximum shield effectiveness.

Please contact MOD-TAP Technical Support for complete wall plate solutions.

Part No.	Description
27.1C.161.B002G	16 Channel Shielded Patch Panel 1U
27.1C.241.B001G	24 Channel Shielded Patch Panel 2U
27.1C.481.B001G	48 Channel Shielded patch Panel 3U


MOD-TAP Baluns

MOD-TAP 3270 Baluns

MOD-TAP 3270 Baluns are used to convert an RG62A/U interface for operation over twisted pair cable. The acceptable transmission rate is 0.5 to 5.0 Mbps. Physical connections are made via BNC and modular jacks. Supports transmission up to 2000 feet (600m) on 24 AWG UTP cable. Available with or without 5" coax lead.

Part No.	Jack Polarization	Active Pins	Lead Type
88-820-40-000	WE4W	4/3	None
88-820-90-000	WE8K (USOC)	5/4	None
88-820-91-000	WE8K (568A/B)	1/2	None
88-820-90-600	WE8K (USOC)	5/4	Flexible
MOD-TAP Twinax Baluns

MOD-TAP Twinax Baluns convert twinax interfaces for operation over twisted pair cable. They are designed for use with IBM Systems 36/38/AS400.

Part No.	Jack Polarization	Active Pins	Lead Type
88-810-40-000	WE4W (USOC)	4/3	None
88-810-80-000	WE8W (USOC)	5/4	None
88-810-91-000	WE8K (568A/B)	1/2	None
88-810-40-600	WE4W (USOC)	4/3	Flexible
88-810-80-600	WE8W (USOC)	5/4	Flexible
88-810-91-600	WE8K (568A/B)	1/2	Flexible


Adapter Plates
MOD-TAP Adapter Plates

MOD-TAP makes it easy to field configure many of its fiber optic products by offering an extensive line of 6-Pak and Adapter Plates. The plates are loaded with high quality SC, ST®, FDDI, and ESCON adapters. No tools are required - the plates install with a simple snap rivet, making installation and/or changes simple.

FDDI to ST®, ESCON to ST®, and SC to ST® Adapter Plates

•	Adapt the ST® connectors from the horizontal cable plant to FDDI or ESCON patch cords

•	Provide two duplex fibers per panel

•	Available in singlemode and multimode versions

•	Singlemode adapters have zirconia alignment sleeves

•	Multimode adapters have polymer alignment sleeves

•	Include removable A, B, and M keys for field configuration

SC to ST® Adapter Plates

•	Adapt the SC connectors from the horizontal cable   plant to ST®

•	Provide three duplex adapters per plate

•	Available in singlemode and multimode versions

•	Color codes per ANSI / EIA / TIA 568A requirements, singlemode - blue, multimode - beige

•	SC Keyed A-B or B-A, per ANSI / EIA / TIA 568A requirements

15-302-00	6-Pak Blank Plate
15-303-MM	6-Pak ST® Plate - Loaded MM
15-303-SM	6-Pak ST® Plate - Loaded SM
15.B0184	6-Pak SC Plate - Loaded SM (Blue)
15.B0354	6-Pak SC Plate - Loaded MM (Beige)
15.B0314	Adapter Plate FDDI to ST® - SM
15.B0294	Adapter Plate FDDI to ST® - MM
15.B0324	Adapter Plate ESCON to ST® - SM
15.B0284	Adapter Plate ESCON to ST® - MM
15.B0304	Adapter Plate SC to ST® - SM (Blue)
15.B0344	Adapter Plate SC to ST® - MM (Beige)
15.B0394	6-Pak FC to ST® Plate - MM
15.B0404	6-Pak FC - FC Plate - SM
6-Pak and Adapter Plates are used in the following MOD-TAP Products:

15.B016G	LI-24
30.B026G	48 Port Configurable Panel Insert (used with FMS II and FMS IIS)
30.B034G	72 Port Configurable Panel Insert (used with FMS II and FMS IIS)
17.B149G	24 Port Wall Mount Configurable FMS
17.B150G	48/72 Port Wall Mount Configurable FMS
17.B155G	24 Port FMS Termination Drawer


LI-24

The LI-24 is a configurable 16 gauge wall mounted optical fiber interconnect unit. It accepts up to 24 fiber adapter ports using any of MOD-TAP's 6-Pak/Adapter Plates. Each LI-24 includes integral fiber management rings, cable ties, and a unique patch cord organizer block that is invaluable for arranging the outgoing cables safely without strain or pressure. Additionally, there is an optional clear patch cord protection shield.

Part No.	Description
15.B016G	LI-24
30.B0330	Patch Cord Protection Shield


Cable Organizer Panels and Rings
MOD-TAP Cable Organizer Panels and Rings

MOD-TAP's cable organizers are a family of rack mounted panels and rings that provide critical cable management and strain relief for your Category 5, fiber, power, or audio cables. They are constructed of rugged steel with a black enamel finish and include Velcro® tie wraps to prevent over compression of your cables. Mounting hardware is included with all of the components.

The 1U Cable Organizer Panel  is available in either 19" or 23" rack mount versions and includes four Velcro® tie wraps (five with 23" version).

The 1U Hinged Cable Organizer Panel mounts directly over rack or cabinet mounted panels or equipment and swings out for easy access. Four Velcro® tie wraps are included.

The Cable Organizer Bar is 12" long and available in two sizes for cable management in the work area, in cabinet applications, or anywhere cables are loose and prone to damage. It includes three Velcro® tie wraps and heavy duty double-sided tape for attaching to surfaces (screw holes are provided for alternative mounting options).

Cable Organizer Rings are available in a variety of configurations to aid in cable management on open bay racks, equipment cabinets, and raised floor environments. The 1.5", 3", and Center Screw Rings attach directly over existing rack or cabinet mounted equipment. The Center Swivel Ring, used in raised floor environments, allows the rotation of the Velcro® to the desired angle.

The adjustable Vertical Cable Organizer Panel mounts in 4' to 7' enclosures or on the sides of open bay racks to provide reusable, non-crimping cable management. 24 Velcro® tie wraps and mounting hardware are included.

25.B0494	1U Cable Organizer Panel 19" - 5/pkg
25.B0484	1U Cable Organizer Panel 23" - 5/pkg
25.B0574	1U Hinged Cable Organizer Panel - 1/pkg
25.B0504	Cable Organizer Bar 12 x1.5 - 5/pkg
25.B0514	Cable Organizer Bar 12 x 3.5 - 5/pkg
25.B0524	Cable Organizer Ring 3" - 6/pkg
25.B0534	Cable Organizer Ring 1.5"- 6/pkg
25.B0544	Cable Organizer Ring - Center Screw - 6/pkg
25.B0554	Cable Organizer Ring - Center Swivel - 5/pkg
25.B0564	Vertical Cable Organizer Panel 44-84" - 1/pkg


Rear Cable Management Tray
MOD-TAP Rear Cable Management Tray

Achieving a fully Category 5 compliant cable plant is easier than ever when you use MOD-TAP's unique Rear Cable Management Tray. This add-on option features cable bend radius guides that provide a safeguard for the customer who wants to ensure a properly installed TIA-approved bend radius. It also includes Velcro® tie-wraps that prevent over-compression of the cables during installation. Each Rear Cable Management Tray services eight channels for a total of three trays per 24 channels. The tray is made of clear Lexan that permits light to pass through dimly lit areas.

25.B0410	Rear Cable Management Tray - 3/Box


Fiber Loss Tester
MOD-TAP Fiber Loss Tester

In optical fiber cable systems for data, the critical performance parameter is the optical attenuation of the completed link. The MOD-TAP FLT is recommended for attenuation testing of terminated multimode fibers at 850nm and 1300nm. The separate optical source and detector units are very small and rugged. Testing is easy and accurate.

Tech Tip

An accurate and dependable loss tester is the minimum requirement for test equipment for any installer, technician, or other person or department with system maintenance responsibility. MOD-TAP recommends that a loss tester be made a part of the equipment budget for every initial optical fiber installation at a given site. The tester would be used for qualification testing of the completed system, and then kept on site for use in troubleshooting and routine maintenance. In fiber data systems, it  may be the only test equipment needed for the cable plant.

Please call technical support for the design loss testing white paper #22. This paper provides information and examples on design loss criteria.

91-4200-00	Fiber Loss Tester
(Includes Optical Light Source and  Power Meter, ST® Adapter, Case and Instruction Manual)


FMS
MOD-TAP FMS

The MOD-TAP FMS is a rack position unit for arranging the incoming fiber slack needed for termination of optical fiber patch cords. It is made of rugged steel with a black powder-coated finish. The front storage drawer has a strain relief bar with Velcro® retaining straps to prevent over-compression of the fiber patch cords. The platform on the back of the unit has cable guides for management of incoming cables. For additional protection on the back, MOD-TAP offers an optional 3U high shroud.

The FMS is used with single position ST® or SC patch panels (see below). For multimedia applications, use a one-, two-, or three-position USP panel with USO fiber and copper modules.

SC PANEL

The SC Panel is available loaded with 12 high quality duplex SC adapters and SC to ST® adapters, in singlemode or multimode versions. Adapters are color-coded beige for multimode and blue for singlemode according to ANSI / EIA / TIA 568A requirements. It may also be purchased half loaded. Used with the FMS, these panels provide the least expensive way to interconnect up to 12 duplex SC ports in a minimum of rack space.

ST® PANEL

The 24 Port ST® Panel mounts directly above the FMS unit to provide a 24 port patch field in only two rack positions. Adding two or more panels provides 72 ports in only 4 rack positions. This panel is available fully loaded, half loaded, or unloaded.

SC to ST® PANEL

The 24 Port SC to ST® Panel is available half-loaded or fully loaded with high quality multimode or singlemode duplex SC to ST® adapters. the SC connection is on the front side of the panel.

FMS

17.B1014	FMS - Fiber Management System
17.B1024	Optional 3U Shroud for FMS
ST® AND SC PATCH PANELS (Used with FMS)

30.B010G	24 Port ST® Panel - Unloaded
30.B012G	24 Port ST® Panel - With 24 MM Adapters
30.B011G	24 Port ST® Panel - With 24 SM Adapters
30.B014G	24 Port ST® Panel - With 12 MM Adapters
30.B013G	24 Port ST® Panel - With 12 SM Adapters
30.B015G	24 Port SC Panel - With 12 SM Duplex Adapters
30.B016G	12 Port SC Panel - With 6 SM Duplex Adapters
30.B035G	24 Port SC to ST® Panel - With 12 SM Duplex Adapters
30.B036G	24 Port SC to ST® Panel - With 6 SM Duplex Adapters
30.B037G	24 Port SC Panel - With 6 MM Duplex Adapters
30.B038G	24 Port SC to ST® Panel - With 6 MM Duplex Adapters
30.B039G	24 Port SC to ST® Panel - With 12 MM Duplex Adapters
30.B040G	24 Port SC Panel  - With 12 MM Duplex Adapters


FMS II
MOD-TAP FMS II

The FMS II is a fully enclosed optical patch panel and integral cable management unit that is suitable for high density applications or where a high level of security and protection is required. The FMS II provides up to 72 SC or ST® ports in only three rack positions using its own unique configurable panel inserts (purchased separately). A clear Lexan cover protects the swing away patch field in the front, and a rugged graphite grey powder-coated steel enclosure protects the incoming cable at the rear. In cases where rear access is necessary, the back panel opens with two quarter-turn screws and/or the back cover can be lifted off by removing four corner screws. The FMS II can be flush mounted or non-flush mounted, making it the most versatile fiber management product available. The FMS II includes rack mounting screws, cable management rings, adjustable mounting ears, cable ties, and labeling.

FMS II

17.B146G FMS II  - Fiber Management System (Lexan door)


FMS II Configurable Panel Inserts
MOD-TAP FMS II Configurable Panel Inserts

MOD-TAP FMS II Configurable Panel Inserts are used with the FMS II. Each panel measures 4.74" H x 16.0" W x 1.25" D. FMS IIS Configurable Panel Inserts accept 6-Pak and adapter plates for custom-configuring the FMS II with any combination of SC or ST® adapters. Use blank plates

for unpopulated positions. They are available in 48 and 72 port versions.

FMS II Panel Inserts

30.B026G	48 Port Configurable Panel Insert - Unloaded
30.B034G	72 Port Configurable Panel Insert - Unloaded
30.B024G	48 Port ST® Panel Insert - Unloaded
30.B025G	48 Port ST® Panel Insert - Loaded MM
30.B018G	72 Port ST® Panel Insert - Unloaded
30.B019G	72 Port SR® Panel Insert - Loaded MM


Wall Mount FMS Patch/Splice Cabinets
MOD-TAP Wall Mount FMS Patch/Splice Cabinets

MOD-TAP Wall Mount Configurable FMS and Wall Mount FMS Splice Cabinets provide a central point for splicing and/or interconnecting fiber optic cables. The Configurable FMS is available in two sizes - 24 port and 48/72 port, and includes an integral configurable panel that accepts 6-Pak plates (sold separately). The FMS Splice Cabinet accommodates up to 72 splices and includes a splice tray holder.

All of the cabinets have a removable front door for easy installation and access to the patch and splice fields, and a keyed lock (included) provides security against unauthorized entry into the splice field. The patch field has a hinged door that secures with a thumb-turn lock (optional keyed lock available). For fixed panel requirements, MOD-TAP offers 24, 48, and 72 port ST® panel inserts used in place of the configurable panels.

24 Port Wall Mount Configurable FMS includes:

•	Integral splice tray holder

•	Configurable patch panel that accepts up to four 6-Paks (purchased separately)

•	Two-section front door

•	Cable installation kit (cable management rings, cable ties, D-hole plugs, port identification labels, one thumb turn lock, one keyed lock, laser warning label)

48 / 72 Port Wall Mount Configurable FMS includes:

•	Configurable patch panel that accepts up to twelve 6-Paks (purchased separately)

•	Two-section front door

•	Cable installation kit (cable management rings, cable ties, D-hole plugs, port identification labels, one thumb turn lock, one keyed lock, laser warning label)

Wall Mount FMS Splice Cabinet includes:

•	One piece slide-off door

•	Splice tray holder (holds up to six splice trays)

•	Cable installation kit (cable management rings, cable ties, D-hole plugs, port identification labels, one thumb turn lock, one keyed lock, laser warning label)

WALL MOUNT FMS CABINETS

17.B149G	24 Port Wall Mount Configurable FMS
17.B150G	48/72 Port Wall Mount Configurable FMS
17.B151G	Wall Mount FMS Splice Cabinet
91.B0170	Fusion Splice Tray
91.B0180	Ultrasplice Mechanical Splice Tray
91.B0190	Fibrlok Mechanical Splice Tray
17.B152G	FMS Splice Tray Holder


Fiber Optic Splice Trays
MOD-TAP Fiber Optic Splice Trays

MOD-TAP's Fiber Optic Splice Trays are used with the Wall Mount RMS Splice Cabinets. Each Tray is self-contained providing fiber management and slack storage with protection for up to 12 fusion or mechanical splices.

An optional splice tray holder is available for use with the 48/72 Port Wall Mount Configurable FMS to accommodate up to six splice trays. Includes mounting hardware.

Part No.	Description
91.B0170	Fusion Splice Tray
91.B0180	Ultrasplice Mechanical Splice Tray
91.B0190	Fibrlok Mechanical Splice Tray
17.B152G	FMS Splice Tray Holder
AFR-00001	Universal Splice Tray (used with MOD-TAP's new Rack Mount FMS Cabinets.


Harmonica
MOD-TAP Harmonica

22-36Y-11	6W 8 Chnl WE8W Male 568B
22-38Y-11	8W 6 Chnl WE8W Male 568B
22-38Y-21	8W 6 Chnl WE8W Female 568B
22-388-17	8W 6 Chnl WE8W Male 568A
22-344-10	4W 6 Chnl WE4W Male USOC
22-366-10	6W 8 Chnl WE6W Male USOC
22-38810	8W 8 Chnl WE8W Male USOC
22-34Y-16	4W 12 Chnl WE8W Male 10BASE-T
22-34Y-26	4W 12 Chnl WE8W Female 10BASE-T
A harmonica breaks out a 25 pair feeder cable into modular jacks and is typically used in open style offices that use modular or movable partitions.

The Harmonica is molded of fire retardant ABS plastic. If rack mounting of multiple units is required, use Mod Patch Panels.

Shipping Weight

12 Ch	4.8 oz. (136g)
8 Ch	4 oz. (113g)
6 Ch	3 oz. (85g)
Dimensions

12 Ch	.98"H x 8.1"W x 1.50"D (25mm x 206mm x 38mm)
8 Ch	.98"H x 5.50"W x 1.50"D (25mm x 140mm x 38mm)
6 Ch	.98"H x 4.20"W x 1.50"D (25mm x 107mm x 38mm)
Shell

ABS UL94V-0 rated in configuration

Color = Grey

Jacks

ABS UL94V-0 rated.

Color = Black

Contacts

Phosphor bronze with a min of 50 micro inches of gold plate over 100 micro inches of nickel.

Wire

24 AWG solid copper conductor 50 Position Connector

Housing = Self extinguishing plastic.

Terminals = Copper alloy with gold over nickel plate in contact areas.


IDC Patch Panels
MOD-TAP IDC Patch Panels

The MOD-TAP high density IDC Patch Panel is a versatile and economic means for cross connecting between trunk and horizontal cabling. This panel is available in 24, 48, and 96 channel versions and features an improved channel identification labeling system and an optional Rear Cable Management Tray that maintains the TIA-approved bend radius required for a Category 5 or PowerCat cable plant.

MOD-TAP IDC Patch Panels are engineered to meet the highest performance standards in the industry. All  MOD-TAP Products exceed UL, TIA and ISO performance and safety requirements.

The back of the panel features new cable strain relief plus KATT IDC contacts that allow for wiring changes without damage to the panel. Terminating onto KATT contacts requires a very low insertion force, reducing fatigue on the installer and providing simpler termination. No special tools are required, as they are compatible with Krone and AT&T termination tools.

PowerCat Enhanced Performance

PowerCat IDC Patch Panels offer enhanced performance over Category 5 products. PowerCat products are:

•	Power Sum compliant for cleaner signals and reduced near end cross-talk (NEXT)

•	Tested to 350MHz

•	Designed to eliminate short link resonance problems

•	Exceed the performance specified by TSB-67 channel and basic link limits

PowerCat Patch Panels

PID-00001	Patch-24 Port 568B PowerCat
PID-00004	Patch-24 Port 568APowerCat
PID-00002	Patch-48 Port 568B PowerCat
PID-00005	Patch-48 Port 568A PowerCat
PID-00003	Patch-96 Port 568B PowerCat
PID-00006	Patch-96 Port 568A PowerCat
Category 5

27.1B.241.B002G	Patch-24 8W 568B-Cat 5
27.1B.481.B002G	Patch-48 8W 568B-Cat 5
27.1B.961.B002G	Patch-96 8W 568B-Cat 5
27.1B.247.B002G	Patch-24 8W 568A-Cat 5
27.1B.487.B002G	Patch-48 8W 568A-Cat 5
27.1B.967.B002G	Patch-96 8W 568A-Cat 5
Category 4

27.1F.241.B003G	Patch-24 8W 568B-Cat 4
27.1F.481.B003G	Patch-48 8W 568B-Cat 4
27.1F.961.B003G	Patch-96 8W 568B-Cat 4
27.1F.247.B002G	Patch-24 8W 568A-Cat 4
27.1F.487.B002G	Patch-48 8W 568A-Cat 4
27.1F.967.B002G	Patch-96 8W 568A-Cat 4
27.1F.249.B005G	Patch-24 8W USOC-Cat 4
27.1F.489.B005G	Patch-48 8W USOC-Cat 4
27.1F.969.B005G	Patch-96 8W USOC-Cat 4
27.1F.249.B006G	Patch-24 6W USOC-Cat 4
27.1F.489.B006G	Patch-48 6W USOC-Cat 4
27.1F.969.B006G	Patch-96 6W USOC-Cat 4
27.1F.246.B002G	Patch-24 8W 10BT-Cat 4
27.1F.486.B003G	Patch-48 8W 10BT-Cat 4
27.1F.966.B003G	Patch-96 8W 10BT-Cat 4
Request a copy of MOD-TAP's PowerCat Link brochure for approved Power Sum cable partners.


PassPort Labeling Options
MOD-TAP PassPort Labeling Options

PassPort provides for both channel identification as well as outlet identification. Channel identification is accomplished via color matched snap-in plastic labels that are preprinted with alphanumeric symbols or with a variety of communications icons.

For outlet identification, use either MOD-TAP Uni-Labels or clear screw covers. The Uni-Labels fit all of the wall plates, including the switch and duplex plates. The clear screw covers fit the configurable wall plates. Both label holders accept 12mm commercial labels (e.g., Brother, Casio) for a neat, professional appearance.

CHANNEL IDENTIFICATION LABELS  (A)

PassPort Field-Configurable Wall Plates come with plastic snap-in channel identification labels that match the plate colors. In addition, MOD-TAP provides spare channel identification labels in all standard PassPort colors plus five additional TIA colors:  green (353C), purple (264C), blue (291C), yellow (101C), and red (184C).

Standard Channel Identification Labels, supplied with the field-configurable plates:

Single Gang Plate:

•	Alphanumeric (A-F and 1-6)

•	Icons (Categories 4 & 5  and phone, fax, LAN, & terminal icons)

•	Custom printed (Contact MOD-TAP Technical Support)

Double Gang Plate:

•	Alphanumeric (A-L  and 1-12)

•	Icons (Categories 4 & 5 and phone, fax, LAN, & terminal icons)

•	Custom printed (Contact MOD-TAP Technical Support)

Duplex Grid Plate:

•	Numeric and Icons (1-6 and phone, fax, LAN, & terminal icons)

Spare Channel Identification Labels may be ordered separately: Available in bags of 20 "trees."

Standard Plate Colors:

•	Alphanumeric (A-F and 1-6)

•	Icons (Categories 4 & 5 and phone, fax, LAN, & terminal icons)

•	Custom printed (Contact MOD-TAP Technical Support)

TIA Colors (green, purple, blue, yellow, red):

•	Alphanumeric (A-F and 1-6)

•	Icons (Categories 4 & 5 and phone, fax, LAN, & terminal icons)

•	Custom printed (Contact MOD-TAP Technical Support)

UNI-LABELS  (B)  FOR OPTIONAL OUTLET IDENTIFICATION

The Uni-Label is a clear, Lexan label holder that clips onto the top edge of the face plate for outlet identification. It comes with blank paper inserts that can be laser printed. In addition, it accepts commercial 13mm labels (e.g., Brother).  The Uni-Label is suitable for use with all of the PassPort wall plates including the duplex and switch plates for a consistent labeling system. Available in bags of 100.

CLEAR SCREW COVERS  (C) FOR OPTIONAL OUTLET IDENTIFICATION

The clear screw cover is another option for outlet identification and is used with configurable face plates only. Like the Uni-Label, the clear screw covers come with laser-printable labels and they accept commercial 13mm labels. This is also a perfect way to customize outlets with a company name. Available in bags of 100.

Channel Identification

11.B019	Spare Channel ID Labels (A-F + 1-6) - 20/Bag
11.B020	Spare Channel ID Labels  (Communications Icons) - 20/Bag
Outlet Identification

11.B0210	Uni-Label - 100/Bag
11.B0220	Clear Screw Covers - 100/Bag
For Channel ID Labels ONLY:

Replace (*) with the following Color Code:

J-green

P-purple

H-blue

K-yellow

C-red

2-white

4-black

5-ivory

E-dark grey


MMI - Multi Media Interface
MOD-TAP MMI - Multi Media Interface

The MOD-TAP MMI and MMI-R are compact wall mounted units for storing and protecting optical fiber. The internal storage spool easily holds 1.5 meters of up to 12 fibers with 900 micron buffers. Both units accept up to six USO modules and can be configured using a combination of UTP, ST®, SC, and FDDI MIC adapters so that all the outlets may be placed in one centrally located unit.

The MMI has a sturdy snap-on plastic cover and is available in three attractive colors: almond, white, and light grey. The MMI-R is a ruggedized version of the MMI and has a graphite grey powder-coated steel cover that overhangs and protects the lower module positions. The metal cover is attached with Allen-type cap screws. Both units include the cover, base, cable ties, Allen wrench, icon labels, and cover hardware.

MMI - Multi Media Interface

17-5229-0*	MMI (plastic cover)
17.B143G	MMI-R (metal cover)
Replace (*) with the following USO Color Code:

1=Almond

2=White

4=Black

8=Lt. Grey


Mod Patch Panels
MOD-TAP Mod Patch Panels

Mod Patch Panels provide simple, easy-to-use closet cross connects that convert 50-position feeder cables to individual modular jack channels.  They are available in 2, 4, 6, and 8-wire (24 AWG) polarizations.  All wiring is totally enclosed. A Velcro® cable retainer allows 50 position installation without tools. Available for USOC, EIA 568A, EIA 568B, or 10BASE-T sequences. Standard product comes with 50 position female receptacles on rear of patching. Male 50-position connectors are optional.

EIA 568B / 356A

27.6E.161.B002G	6	16	2	WE8W	1

27.6E.241.B002G	6	24	 3	WE8W	1

27.6E.481.B001G	6	48	 6	WE8W	2

27.6E.961.B001G	6	96	12	WE8W	4

27.6E.241.B004G	8	24	 4	WE8W	1

27.6E.481.B002G	8	48	 8	WE8W	2

27.6E.961.B002G	8	96	16	WE8W	4

EIA 568A

27.6E.247.B001G	8	24	  4	WE8W	1

27.6E.487.B003G	8	48	  8	WE8W	2

27.6E.967.B001G	8	96	16	WE8W	4

USOC

27.6E.169.B001G	2	16	 1	WE4W	1

27.6E.259.B001G    	2	25	 1	WE4W	1

27.6E.249.B001G	4	24	 2	WE4W	1

27.6E.489.B001G	4	48	 4	WE4W	2

27.6E.969.B001G	4	96	 8	WE4W	4

27.6E.249.B002G	6	24	 3	WE6W	1

27.6E.489.B002G	6	48	 6	WE6W	2

27.6E.969.B002G	6	96      	12	WE6W	4

27.6E.249.B003G	8	24	 4	WE8W	1

27.6E.489.B003G	8	48	 8	WE8W	2

27.6E.969.B003G	8	96	16	WE8W	4

10BASE-T

27.6E.246.B002G	4	24	 2	WE8W	1

27.6E.486.B001G	4	48	 4	WE8W	2

27.6E.966.B001G	4	96	 8	WE8W	4

APPLETALK

27.6E.484.B001G	2	48	 1	WE6W	2


Mod-Star III
MOD-TAP Mod-Star III

The Mod-Star III Passive Hub was designed specifically for the demands of the AS/400 environment.  The Mod-Star III provides a flexible and reliable UTP alternative to twin-axial cabling. The hub provides each twinax device attached to it the same interface and signaling found on twinax cabling. It is totally transparent to the System AS/400 twinaxial protocol.

•	Up to 2000 feet (609.6 meters) transmission distance  from each device terminal to host

•	High density - 14 channels in one rack position

•	Unsurpassed reliability - passive design leaves nothing  to burn out

•	Sophisticated balanced circuit design for reliable transmission

88.00.149.B0044	Double Rack Mount Wired USOC
88.00.141.B0044	Double Rack Mount Wired EIA 568A/B


Multi User Telecommunications Outlet (MUTO)
MOD-TAP Multi User Telecommunications Outlet (MUTO)

The MOD-TAP Multi User Telecommunications Outlet (MUTO) is the ideal solution for high-density fiber or copper requirements in the office environment. This sleek product holds up to 12 USO modules (24 channels) and is easily mounted near file servers, hub products, and development workstations. For added flexibility, the outlet can be mounted over US 1 single gang boxes or onto power poles. The MUTO can accommodate up to six angled fiber modules (no straight through fiber modules).

The MUTO requires a total of up to 13 part numbers:

•	One Multi User Telecommunications Outlet

•	12 USO Modules or Blanks

PUS-00001 Multi User Telecommunications Outlet Camouflage Grey color


PassPort Straight and Angled Modules
MOD-TAP PassPort Straight and Angled Modules

Straight and Angled Modules are available in one or two channel versions in a variety of sequences including USOC, 568A and 568B, and are Category 4 and Category  5 compliant. PassPort modules come in five NEMA colors to match the PassPort wall plates:  electrical ivory, white, black, and dark grey. The front of PassPort modules can be labeled for easy channel identification. The back has MOD-TAP KATT connectors (110 tool compatible) for easy termination. All modules are UL compliant for both fire retardancy and Category 4 and Category 5 performance.

BNC and Video Modules

BNC and Video Modules are available in colors to match the PassPort wall plates:  electrical ivory, white, black, and dark grey.

Blank Modules

Blank Modules are available in colors to match the PassPort wall plates:  electrical ivory, white, black,

and dark grey. They are used as a filler for vacant plate positions.

PowerCat Enhanced Performance

PowerCat USO and PassPort Wallplates and IDC Patch Panels offer enhanced performance over Category 5 products. PowerCat products are:

•	Power Sum compliant for cleaner signals and reduced near end cross-talk (NEXT)

•	Tested to 350MHz

•	Designed to eliminate short link resonance problems

•	Exceed the performance specified by TSB-67 channel and basic link limits

PassPort Straight Double Modules

MPP-00006-0*	8 Wire 568B PowerCat
MPP-00008-0*	8 Wire 568A PowerCat
11.1B.027.B002*	8 Wire 568A Cat 5
11.1B.021.B002*	8 Wire 568B Cat 5
11.1F.029.B004*	4 Wire USOC Cat 4
11.1F.029.B005*	6 Wire USOC Cat 4
11.1F.029.B006*	8 Wire USOC Cat 4
11.1F.027.B002*	8 Wire 568A Cat 4
11.1F.021.B002*	8 Wire 568B Cat 4
PassPort Straight Single Modules

MPP-00005-0*	8 Wire 568B PowerCat
MPP-00007-0*	8 Wire 568A PowerCat
11.1B.017.B002*	8 Wire 568A Cat 5
11.1B.011.B002*	8 Wire 568B Cat 5
11.1F.019.B004*	4 Wire USOC Cat 4
11.1F.019.B005*	6 Wire USOC Cat 4
11.1F.019.B006*	8 Wire USOC Cat 4
11.1F.017.B002*	8 Wire 568A Cat 4
11.1F.011.B002*	8 Wire 568B Cat 4
PassPort Angled Double Modules

MPP-00002-0*	8 Wire 568B PowerCat
MPP-00004-0*	8 Wire 568A PowerCat
11.1B.027.B001*	8 Wire 568A Cat 5
11.1B.021.B001*	8 Wire 568B Cat 5
11.1F.029.B001*	4 Wire USOC Cat 4
11.1F.029.B002*	6 Wire USOC Cat 4
11.1F.029.B003*	8 Wire USOC Cat 4
11.1F.027.B001*	8 Wire 568A Cat 4
11.1F.021.B001*	8 Wire 568B Cat 4
PassPort Angled Single Modules

MPP-00001-0*	8 Wire 568B PowerCat
MPP-00003-0*	8 Wire 568A PowerCat
11.1B.017.B001*	8 Wire 568A Cat 5
11.1B.011.B001*	8 Wire 568B Cat 5
11.1F.019.B001*	4 Wire USOC Cat 4
11.1F.019.B002*	6 Wire USOC Cat 4
11.1F.019.B003*	8 Wire USOC Cat 4
11.1F.017.B001*	8 Wire 568A Cat 4
11.1F.011.B001*	8 Wire 568B Cat 4
Other PassPort Modules

11.B024*	Single BNC Module
11.B025*	Video F Module
11.B043*	Video S Module
11.B044*	2 Audio Connector Module
11.B023*	Blank Module
Replace (*) with the following PassPort Color Code:

2-white

4-black

5-ivory

E-dark grey

Request a copy of MOD-TAP's PowerCat Link brochure for approved Power Sum cable partners.


Rack Mount PDS Panels
MOD-TAP Rack Mount PDS Panels

The Rack Mount KATT PDS Panel allows the user to combine a block-based system with active equipment on a 19" rack. 3U and 4U KATT PDS Panels are 200 pair patch panels with integral ring runs. The block-based format affords individual pair management, which is not possible with RJ patching. Cross connection can be defined as either 1, 2 or 4-pair channels at the installation stage. These panels are a cost-effective, convenient solution to rack mounted patching.

Rack Mount PDS Panels

Part No.	Description
36.B040G	3U PDS Panel  - unloaded
36.B021G	3U PDS Panel - 96 KATT-2 Connectors
36.B020G	3U PDS Panel - 48 KATT-4 Connectors
36.B029G	3U PDS Panel - 40 KATT-5 Connectors
36.B022G	4U PDS Panel  - unloaded
36.B024G	4U PDS Panel - 96 KATT-2 Connectors
36.B023G	4U PDS Panel - 48 KATT-4 Connectors
36.B028G	4U PDS Panel - 40 KATT-5 Connectors
KATT connectors

36.B0050	KATT-2 Connectors - 100 / bag
36.B0060	KATT-4 Connectors - 100 / bag
36.B0260	KATT-5 Connectors - 100 / bag
36.B0030	KATT Dust Caps - 100 / bag


Rack Mount Power Strip / Surge Suppressor (110 VAC)
MOD-TAP Rack Mount Power Strip / Surge Suppressor (110 VAC)

The Rack Mount Power Strip features 12 outlets and an easily accessible 15 AMP circuit breaker to provide power to rack mounted equipment. There is a 12 foot, 14 AWG AC cord and two isolated filter banks to prevent equipment interaction. It also offers superior spike filtering and line noise attenuation. Mounts easily into any 19" rack.

25.B027G	Rack Mount Power Strip/Surge Suppressor


PassPort Factory-Configured Wall Plates
MOD-TAP PassPort Factory-Configured Wall Plates

PassPort Factory-Configured Wall Plates are available in one or two-channel versions in a variety of sequences including 568A, 568B, and USOC, and are Category 4 and Category 5 compliant. Factory-configured plates mount to a standard US 1 box or can be used with PassPort fiber plates for multimedia applications. The front of the plates can be labeled for easy channel identification (see pages C-18 and C-19 for labeling options). All PassPort wall plates are available in five NEMA colors:  electrical ivory, white, black, and dark grey. Color-matched mounting screws are included.

•	Sized to compensate for uneven openings  in the  wallboard

•	UL 1863 approved

•	Can be used with PassPort Fiber Plate for multimedia applications

•	One piece design is easier to terminate than keystones offered by others

Two Channel Factory-Configured Plates

WNC-00002-0*	Fixed Plate 8W 568B PowerCat
WNC-00004-0*	Fixed Plate 8W 568A PowerCat
11.1B.027.B003*	Fixed Plate 8W 568A Cat 5
11.1B.021.B003*	Fixed Plate 8W 568B Cat 5
11.10.020.B001*	Fixed Plate 6W USOC Cat 4 and 8W 568B Cat 5
11.10.020.B002*	Fixed Plate 6W USOC Cat 4 and 8W 568A Cat 5
11.1F.029.B007*	Fixed Plate 4W USOC Cat 4
11.1F.029.B008*	Fixed Plate 6W USOC Cat 4
11.1F.029.B009*	Fixed Plate 8W USOC Cat 4
11.1F.027.B003*	Fixed Plate 8W 568A Cat 4
11.1F.021.B003*	Fixed Plate 8W 568B Cat 4
One Channel Factory-Configured Plates

WNC-00001-0*	Fixed Plate 8W 568B PowerCat
WNC-00003-0*	Fixed Plate 8W 568A PowerCat
11.1B.017.B003*	Fixed Plate 8W 568A Cat 5
11.1B.011.B003*	Fixed Plate 8W 568B Cat 5
11.1F.019.B007*	Fixed Plate 4W USOC Cat 4
11.1F.019.B008*	Fixed Plate 6W USOC Cat 4
11.1F.019.B009*	Fixed Plate 8W USOC Cat 4
11.1F.017.B003*	Fixed Plate 8W 568A Cat 4
11.1F.011.B003*	Fixed Plate 8W 568B Cat 4
Replace (*) with the following PassPort Color Code:

2-white

4-black

5-ivory

E-dark grey

Request a copy of MOD-TAP's PowerCat Link brochure for approved Power Sum cable partners.


PassPort Deco Grid Plate
MOD-TAP PassPort Deco Grid Plate

The PassPort Deco Grid Plate allows you to install PassPort modules in offices where Decora® is the standard but MOD-TAP is the preferred manufacturer - while adding extra features not available in standard Decora® products. The PassPort Deco Grid Plate provides up to four channels in a single gang wall plate using PassPort modules, and includes provisions for outlet and channel identification using MOD-TAP's high-visibility snap-in channel identifiers and an information outlet label. For situations where this is not a requirement and keeping costs down is critical, the Deco Grid Plate is available without the outlet identifier.

11.B034*	PassPort Deco Grid Plate - with label
11.B030*	PassPort Deco Grid Plate - no label
Replace (*) with the following PassPort Color Code:

2-white

4-black

5-ivory

E-dark grey


PassPort Field-Configurable Wall Plates
MOD-TAP PassPort Field-Configurable Wall Plates

PassPort Field-Configurable Wall Plates accept up to three PassPort modules (six channels) in a single gang or six PassPort modules in a double gang. Each plate comes with mounting screws, color matched screw covers, and channel identification labels (alphanumeric or communications icons - terminal, phone, etc.). All PassPort wall plates are available in five NEMA colors:  electrical ivory, white, black, and dark grey. Matching mounting screws are included. Order modules separately.

•	Icons are pad printed for high visibility

•	Mounts to a US 1 box

•	Packaging has been minimized for quick installation

•	Sized to compensate for uneven openings in the wallboard

•	UL 1863 approved

•	Available with blank icons for use with indelible marker

The PassPort Field-Configurable Single Wall Plate requires a total of four part numbers:

•	One wall plate

•	Three PassPort Modules or blanks

The PassPort Field-Configurable Double Wall Plate requires a total of seven part numbers:

•	One wall plate

•	Six PassPort Modules or blanks

11.B041*	Face Plate - Single - A-F + 1-6
11.B042*	Face Plate - Single - Communications Icons
11.B047*	Face Plate - Single - Blank Icons
11.B004*	Face Plate - Double - A-L + 1-12
11.B005*	Face Plate - Double - Communications Icons
Replace (*) with the following PassPort Color Code:

2-white

4-black

5-ivory

E-dark grey


PassPort Modular Furniture Bezel
MOD-TAP PassPort Modular Furniture Bezel

MOD-TAP's PassPort Modular Furniture Bezel provides up to two channels in a minimum of space. This flush-mount bezel accommodates standard size modular furniture cutouts and snaps in for a secure, snug fit. For optimum cabling system documentation, the bezel accepts a PassPort Uni-Label for outlet identifications, plus the PassPort module accepts highly visible channel identification labels. As with all PassPort products, the Modular Furniture Bezel has a very low profile and blends in seamlessly with other office fixtures including electrical outlets and switch plates. Available in electrical ivory and black only.

Part No.	Description
11.B0325	PassPort Modular Furniture Bezel - Ivory
11.B0324	PassPort Modular Furniture Bezel - Black
Dimensions	1.875"H x 3.125"W x .25"D (48mm x 79mm x 6mm)
Shipping Weight	0.5 oz. (14g)
Material	Molded Polymer
Accommodates  Cutout Size	1.35" x 2.65" min (34mm x 67mm) to 1.40" x 2.75" max (35mm x 70mm)


PassPort Duplex Grid and Accessory Plates
MOD-TAP PassPort Duplex Grid and Accessory Plates

PassPort Duplex Grid Plates are used to mount one or two angled or straight PassPort modules anywhere a duplex outlet can be: modular furniture, power poles, doghouses, and US1 boxes. They are ideal for use where lower density is needed and/or with stainless steel, brass, or wooden face plates. Available with or without channel identification labels.  Duplex Grid Plates are constructed of molded polymer, in five  NEMA colors (see above), and accommodate a variety of  modules.

Part No.	Description
11.B029*	Duplex Grid Plate - without labels
11.B008*	Duplex Grid Plate - 1-6 + icons
11.B007*	Duplex Face Plate - Single
11.B016*	Blank Plate
11.B011*	Switch Plate
Replace (8) with one of the following color options

5 = Ivory

2 = White

E = Dark Grey

4 = Black


PassPort Surface Block
MOD-TAP PassPort Surface Block

The PassPort Surface Block is a surface mount outlet that provides up to four channels in a minimum of space. It accepts either one or two PassPort UTP modules and is available in two versions. One version has a combination magnetic/screw mount base (magnets sold separately) for mounting to steel partitions, desks, and walls.  The other has a modular furniture base. Both versions allow either side or rear cable entry.

The PassPort Surface Block requires a total of up to three part numbers:

•	One Block (housing)

•	One or Two PassPort UTP Modules

11.B046*	PassPort Surface Block Magnet / Screw Base
11.B045*	PassPort Surface Block Modular Furniture Base
35.B0120	Optional Magnet Kit for 11.B046*
Replace (*) with the following PassPort Color Code:

2-white

4-black

5-ivory

E-dark grey


PassPort Fiber Modules
MOD-TAP PassPort Fiber Modules

Part  No.	Description
11.B0270	Dual SC Module - SM
11.B0370	Dual SC Modules - MM
11.B0380	Dual SC to ST¨  Module - MM
11.B0390	Dual SC to ST¨ Module - SM
11.B0280	Dual ST¨ Module-MM
11.B0330	Dual ST¨ Module-SM
PassPort Fiber Modules are designed for use exclusively with the PassPort Fiber Plates. They are available in both dual ST and SC versions - singlemode and multimode - and are designed to be vertically oriented in the base plate for proper cable management.

MECHANICAL CHARACTERISTICS

Optical Fiber Adapters

ST¨ - Multimode - Threaded

Housing (body): Nickel plated zinc

Alignment Sleeve: Molded polymer

ST¨ - Singlemode - Threaded

Housing (body): Nickel plated zinc

Alignment Sleeve:  Ceramic

Dual SC - Multimode/Singlemode

Alignment Sleeve: Phosphor bronze

IMPORTANT NOTE

The fiber modules are for use only with the fiber plate. They will not fit into any other PassPort wall plates.

Dimensions	1.25"H x 1.5"W x .56"D (32mm x 38mm x 14mm)
Shipping Weight	.5 oz (14g)


PassPort Audio Connector Module
MOD-TAP PassPort Audio Connector Module

MOD-TAP's PassPort Audio Connector  Modules use two high quality phone jacks with solder lugs on the back. They mate with Switchcraft type 750 miniature phone plugs (0.141 in. dia. tip plug).

PassPort module colors - Replace the * in the part number with one of the following:

2 = White

4 = Black

5 = Ivory

E = Dark Grey

MODULE SPECIFICATIONS

Dimensions	.90"H x 1.71"W x .875"D (23mm x 43mm x 22mm)
Shipping Weight	0.5 oz. (14g)
Material	ABS Plastic KJU


PassPort Video Modules
MOD-TAP PassPort Video Modules

Part  No.	Description
MPP-00010-0*	Recessed Video F Module
11.B025*	Video F Module
* Color Options

2 = White

4 = Black

5 = Ivory

E = Dark Grey

MOD-TAP's PassPort Video F Connector Modules are available in recessed and non-recessed versions. The Recessed Video F Connector Module includes a dust cover that can be left in place when incoming cable is connected. The modules are available in five NEMA colors to match PassPort mountings (see chart above).

MECHANICAL CHARACTERISTICS

MODULE

Plastic Housing:	Glass Filled PBT, UL94V-0
Shipping Weight	< .5 oz. (14g)
Double Female Splice Adapter "F" Connector

Type	Double Female Splice Adapter
Body	Brass
Body Plating	Nickel
Pin	Steel
Pin Plating	Tin
Dielectric	Delrin
Length	1.04"
Diameter	0.31"
Flat	D with 3/8 x 32 hex nut and internal tooth lockwasher
ELECTROMECHANICAL

Mating Cycles	500 min.
Impedance	Non constant
Min. Insulation

Resistance	5000 Megohm at 500 VDC
Dielectric Withstanding Voltage	1500V RMS
Temperature Range	-55¡C to +155¡C
Vibration, shock, and temperature cycling in accordance with MIL-STD-1344.


PassPort Video S Modules
MOD-TAP PassPort Video S Modules

MOD-TAP's PassPort S Video Module features a high quality female to female feed through connector. No soldering is required. S Video Connectors are used frequently in school environments where wall mounted monitors are wired to a laptop or PC. The S video connector separates the chroma (color) from the video, thus avoiding crosstalk, and is used with a special super VHS cable.

PassPort module colors - Replace the * in the part number with one of the following:

2 = White

4 = Black

5 = Ivory

E = Dark Grey

MODULE DIMENSIONS

Dimensions	.90"H x 1.71"W x .875"D (23mm x 43mm x 22mm)
Shipping Weight	1 oz. (28.35g)
Material	ABS Plastic KJU


PassPort Video F Modules
MOD-TAP PassPort Video F Modules

Part  No.	Description
MPP-00010-0*	Recessed Video F Module
11.B025*	Video F Module
* Color Options

2 = White

4 = Black

5 = Ivory

E = Dark Grey

MOD-TAP's PassPort Video F Connector Modules are available in recessed and non-recessed versions. The Recessed Video F Connector Module includes a dust cover that can be left in place when incoming cable is connected. The modules are available in five NEMA colors to match PassPort mountings (see chart above).

MECHANICAL CHARACTERISTICS

MODULE

Plastic Housing	Glass Filled PBT, UL94V-0
Shipping Weight	< .5 oz. (14g)
Double Female Splice Adapter "F" Connector

Type	Double Female Splice Adapter
Body	Brass
Body Plating	Nickel
Pin	Steel
Pin Plating	Tin
Dielectric	Delrin
Length	1.04"
Diameter	0.31"
Flat	D with 3/8 x 32 hex nut and internal tooth lockwasher
ELECTROMECHANICAL

Mating Cycles	500 min.
Impedance	Non constant
Min. Insulation

Resistance	5000 Megohm at 500 VDC
Dielectric Withstanding Voltage	1500V RMS
Temperature Range	-55¡C to +155¡C
Vibration, shock, and temperature cycling in accordance with MIL-STD-1344.


Mod-Mod Adapters

09-1**-***	Style 1 MOD-MOD Adapters
09-2**-***	Style 2 MOD-MOD Adapters
09-3**-***	Style 3 MOD-MOD Adapters
09-A**-***	Style A MOD-MOD Adapters
09-B**-***	Style B MOD-MOD Adapters
09-KIT-**	MOD-MOD Kits (pig tail not included)
MOD-MOD Adapters provide a simple, compact way of changing wiring sequence and/or polarization. MOD-MOD Adapters may be installed free hanging or attached to a surface with Velcro. Style 3 and B MOD-MOD Adapters can be used to temporarily split four pair cable into multiple channels.

Special wiring is available for the MOD-MOD adapters. Call MOD-TAP Tech Support at 508-772-4884 for further information.

Shipping Weight	1 oz. (28g)
Material	ABS UL94V-0 rated in configuration
Color	Beige (except kits - see below)
Style 1 & 3

(Mod Cord)	26 AWG stranded
Style A & B

(Twisted Pair)

Gauge	24 AWG stranded
Nom. cap.	15pF/ft.
Max conductor resistance at 68û F	24.8½/1000 ft.
Max signal attenuation @ 1MHz	6.4 dB/1000 ft.
Characteristic impedance	105½ @ 1 MHz
Plug

Material-Body: Polycarbonate meeting or exceeding UL94V-0

Material-Contacts: Phosphor bronze with a minimum of 50 micro inches gold over a minimum of 100 micro inches of nickel


Mod IBM Adapters

The Mod IBM Adapter converts the IBM Data Connector to a modular jack. This allows unshielded twisted pair (UTP) (IBM Type 3) wiring to be used in the desk-to-closet portion of the IBM cabling solution. It is used at IBM wall plates or with equipment such as the IBM 8228 MAU for interfacing to modular components. It can also be used to connect equipment to IBM distribution panels already installed.

Part No.	Description
13-300	IBM Data Connector Kit


PassPort BNC Modules
MOD-TAP PassPort BNC Modules

Part  No.	Description
11.B024*	Single BNC Module
MPP-00009-0*	Recessed BNC Module
* Color Options

2 = White

4 = Black

5 = Ivory

E = Dark Grey

MOD-TAP's PassPort BNC Connector Modules are available in recessed and non-recessed versions. The Recessed BNC Connector Module includes a dust cover that can be left in place when incoming cable is connected. The modules are available in five NEMA colors to match PassPort mountings (see chart above).

MODULE

Plastic Housing:	Glass Filled PBT, UL94V-0
Shipping Weight	<.5 oz (14g)
BNC CONNECTOR

ELECTRICAL CHARACTERISTICS

Impedance	50 Ohm
Working Voltage	500 volts, RMS at sea level
Frequency Range	0-4 GHz with low reflection
Contact Resistance	Outer - 0.2 milliohms; Center - 2.1 milliohms (.00005 gold)
Insulation Resistance	500 megohms minimum
Dielectric Withstanding Voltage	1500 volts, RMS at sea level
Corona level	375 volts minimum at 70,000 feet
VSWR	1.3 max @ 4 GHz
ENVIRONMENTAL CHARACTERISTICS

Recommended Temperature Range	-55ûC to +85ûC
Vibration	MIL-Std. 202
Shock	MIL-Std. 202, 100 Gs
Moisture Resistance	MIL-Std. 202
MECHANICAL CHARACTERISTICS

Durability	500 cycles (.00005 gold)
Force to Engage or Disengage	3 lb. maximum
Coupling Nut Retention	120 lb. minimum
Cable Retention	60 lb. with 95% braid coverage - RG 58 C/U Cable
MATERIALS

Body	Zinc
Contact	Brass & Beryllium Copper
Spring Washer	Beryllium Copper
Insulator	Delrin/TPX Polymethylpentene
Plating	Body - Nickel
Contact	Nickel/Gold


Side Rings
MOD-TAP Side Rings

MOD-TAP's 1U Side Ring is fastened on the side of a rack to dress cables vertically. A necessity for proper vertical cable management, it is designed to mount in the same holes used to attach all modular panels and IDC panels to 19" racks. Two 12-24 x .5" mounting screws are included.

The 1U Side Ring - Deep is also used for vertical cable management and provides twice the cable capacity of the standard side ring. Two 12-24 x .5" mounting screws are included.

The 2U Side Ring is used to provide vertical cable management on a rack or wall. Because of its size, this ring can only be attached to blank panels, power strips, and open rack positions. This ring can also be used to route cables to a KATT PDS wall-mounted section when sheet rock screws are used (not provided). It holds twice the volume of cables as our 1U ring or the same volume of cables as the 1U Side Ring - Deep. Two 12-24 x .5" mounting screws are included.

25.B0284	1U Side Ring
25.B0364	1U Side Ring - Deep
25.B0424	2U Side Ring


Rack Mounted Fms Patch/Splice Cabinets
MOD-TAP Rack Mounted FMS Patch/Splice Cabinets

Part No.	Description
RFR-00003	RM FMS 4U 48P Patch
RFR-00004	RM FMS 8U 48P Patch/Splice
RFR-00001	RM FMS 4U 72P Patch
RFR-00005	RM FMS 4U 72P Splice
RFR-00002	RM FMS 8U 72P Patch/Splice
RFR-00006	RM FMS 8U 96P Patch
RFR-00007	RM FMS 8U 144P Patch
35.B0130	Optional Keyed Lock
AFR-00001	Universal Splice Tray
The newest additions to MOD-TAP's family of Fiber Management Systems (FMS) are the Rack Mounted FMS Patch/Splice Cabinets - a series of configurable rack mounted patching and splicing units that are available in seven styles to accommodate between 48 and 144 ports. Single units (4 rack positions) include 48 and 72 Port Patch Units and a 72 Port Splice Unit. The remainder of the Rack Mounted FMS Products are double units (8 rack positions) and include 48 and 72 Port Combination Patching and Splicing Units, and 96 and 144 Port Patch Units.

For splicing applications, the Rack Mounted FMS Splice and Patch/Splice cabinets accommodate the MOD-TAP Universal Splice Tray (Part No. AFR-00001). Other manufacturers splice trays are not recommended as they may not fit securely in the splice tray holder. The Universal Splice Tray is purchased separately.

The Rack Mounted FMS Patch/Splice Cabinets are completely configurable using MOD-TAP's snap in 6-Pak/Adapter Plates loaded with high quality ST¨, SC, FC, FDDI, and ESCON adapters.  All units are constructed of rugged, graphite grey powdercoated steel and include rack mounting hardware, MOD-TAP's new fiber management rings, cap plugs, and cable ties. An optional keyed lock is available for added security.

SPECIFICATIONS

Material	16 Gauge CRS
Finish	Graphite Grey Powdercoat


Mod Strut
MOD-TAP Mod Strut

The Mod Strut Mounting Kit consists of two adjustable braces and the necessary hardware to mount an open bay rack to a fixed wall. Adjustable from 20.5" to 32.0" (525mm - 843mm).

Material	11 AWG Cold Rolled Steel
Finish	Black Electrocoat
Dimensions	Adjustable size 20.5"-32.0"D (525mm - 843mm)
Part No.	Description
25-222	Mod Strut Mounting Kit
25.B0044	Open Bay Rack (shipped unassembled)


Octopus
MOD-TAP Octopus

24-224-10	Octopus 25 Channel 2W 2 ft. M USOC
24-244-10	Octopus 12 Channel 4W 2 ft. M USOC
24-244-20	Octopus 12 Channel 4W 2 ft. F USOC
24-265-13	Octopus 8 Channel MMJ 2 ft. M DEC
24-266-10	Octopus 8 Channel 6W 2 ft. M USOC
24-266-20	Octopus 8 Channel 6W 2 ft. F USOC
24-268-11	Octopus 8 Channel 8W 2 ft. M 568B
24-268-18	Octopus 8 Channel 8W 2 ft. M OPENDEC
24-288-10	Octopus 6 Channel 8W 2 ft. M USOC
24-288-11	Octopus 6 Channel 8W 2 ft. M 568B
24-288-17	Octopus 6 Channel 8W 2 ft. M 568A
24-466-10	Octopus 8 Channel  6W 4 ft. M USOC
24-488-10	Octopus 6 Channel 8W 4 ft. M USOC
24-488-11	Octopus 6 Channel 8W 4 ft. M 568B
24-644-10	Octopus 12 Channel 4W 6 ft. M USOC
24-265-13	Octopus 8 Channel MMJ 6 ft. M DEC
24-666-10	Octopus 8 Channel 6W 6 ft. M USOC
24-688-10	Octopus 6 Channel 8W 6 ft. USOC
24-688-21	Octopus 6 Channel 8W 6 ft. F 568B
An octopus is used for system equipment with multiple connections. They consolidate from individual 2, 4, 6, or 8- wire modular plugs to a 25 pair feeder cable. Standard product has a 50 position male connector and 2 ft. legs. 50 Position female connectors and four or six ft. legs are also available.

Shipping Weight

12 Ch	14 oz. (397g)
8 Ch	10 oz. (283g)
6 Ch	7 oz. (198g)
50 Position Connector

Material	Self extinguishing plastic
Color	Black
Terminals	Copper alloy with gold over nickel
Plug

Body	Polycarbonate meeting or exceeding UL94V-0
Contacts	Phosphor bronze with a min. of 50 µinches gold over a min. 100 µinches nickel
Mod Cord

Gauge	26 AWG
Jacket	Grey PVC
Capacitance	Varies within 11 to 6 pF/ft.
Characteristic Impedance	134 ohms
Resistance	0.0675 ohms/ft.
Cable (leg) Length	2, 4, and 6 ft.


Ring Run Covers
MOD-TAP Ring Run Covers

Part No.	Description
25.B044G	2U Ring Run with Cover
25.B045G	1U Ring Run with Cover
25.B046G	2U Ring Run Cover 6/Box
25.B047G	1U Ring Run Cover 6/Box
MOD-TAP's Ring Run Covers provide a sleek, tidy veneer for our 1U and 2U Ring Run Panels. They are constructed of heavy-duty extruded PVC and can be custom printed with your logo. The covers are available in packages of six, or individually with a 1U or 2U Ring Run Panel.

Dimensions

1U Ring Run Cover (only)

1.750H x 160W x 1.50D (4 4mm x 406mm x 38mm)

2U Ring Run Cover (only)

3.50H x 160W x 1.50D (88mm x 406mm x 38mm)

1 Position Ring Run with Cover

1.750H x 19.00W x 2.750D (44mm x 483mm x 70mm)

2 Position Ring Run with Cover

3.50H x 19.00W x 2.8750D (88mm x 483mm x 73mm)

Shipping Weight

2U Ring Run Cover   Box of 6	2 lb. 8 oz. (1.1 kg)
2 Position Ring Run with Cover	2 lb. 9 oz. (1.2 kg)
1U Ring Run Cover   Box of 6	2 lb. 3 oz. (1.0 kg)
1 Position Ring Run with Cover	1 lb. 12 oz. (794 g)
Material	Extruded UV Grade Rigid PVC
Color	Graphite Grey


SLT3 Tester
MOD-TAP SLT3 Tester

33-100	SLT3 Single Line Tester
33-100-P	SLT3 Carry Case
33.B0010	SLT3 Accessory Kit with Case - includes two 6-wire line cords, two 8-wire line cords, and four frame adapters (110-USOC, 110-568B, KATT 568B, and KATT 568A).  SLT3 Not Included.
33.B0020	SLT3 Tester with Carry Case
The MOD-TAP SLT3 Tester provides instant identification of most common voice and data cabling problems including shorts, opens, reversals, and miswires.

The master and remote units separate for end-to-end testing of installed cabling. Shorts, opens, reversals, or miswires are easily detected within seconds - the continuously sequencing LED display immediately alerts you to problems in the cabling system. Both pieces simply snap and lock together when not in use, making it easy to carry and store. When the units are interlocked, the battery is disabled, thus prolonging battery life.

Designed to fit into a tool box or pocket, the SLT3 Tester has a convenient "ring" feature for attaching to a belt or frame. A durable nylon carry case may be purchased as an optional accessory. Frame adapters are available for testing from the punch down block to the wall plate in one simple operation (See MOD-TAP Applications Catalog).

Dimensions

Master:	4.3"H x 2.3"W x 1.5"D (109.2mm x 58.4mm x 38.1mm)
Remote:	4.3"H x 2.3"W x 1.5"D (109.2mm x 58.4mm x 38.1mm)
Set:	5.75"H x 2.3"W x 1.5"H (146mm x 58.4mm x 38.1mm)
Shipping Weight

Master:	5 oz. (141g)
Remote:	3 oz. (85g)
Set:	8 oz. (226g)
Accessory Kit:	11 oz. (312g)
Material	ABS Cycolac KJW
Color	Grey
Power Requirements	9V Alkaline Battery (included)
Max Distance	10,000 ft.
Interface	USOC, 568A, and 568B
Mating	4W, 6W, 8W, and 8W-keyed plugs
Contact Material	50 µinches gold over 100 µinches nickel


US 1 and US 2 Surface Boxes
MOD-TAP US 1 and US 2 Surface Boxes

15-101-*	US 1 Surface Box
15-201-0*	US2 Surface Box
15-102-*	US 1 Extension
Replace * with the following color codes:

1 = USO Almond

2 = USO White

4 = Black

5 = PassPort Ivory

8 = USO Grey

E = PassPort Grey

W = PassPort White

The US 1 Surface Box is designed to mount to a wall, floor, or other flat surface. Ideal for use in areas where flush mounting is not possible. Convenient "molded-in" rear and side cable entries easily accommodate coax.

The US 2 Surface Box is designed to surface mount a double gang wall plate wherever flush mounting is impractical. For easy installation cover installs and removes without tools. It contains knockouts for cable entry products, including conduit.

The Extension Yoke is designed to be used in applications that require additional depth. For example, an extension yoke can be used with the USO Single Gang Bezel in certain modular furniture applications.

MECHANICAL CHARACTERISTICS

Material	ABS Plastic	Meets UL 94V-0
Weight	US 1	3.0 oz. (85g)
	US 2	4.0 oz. (113g)
	Ext. Yoke	2.0 oz. (57g)
Dimensions

US 1	4.5"H x 2.75"W x 1.85"D (114mm x 70mm x 47mm)
US 2	4.5"H x 5.0"W x 1.625"D (114mm x 127mm x 42mm)
Ext. Yoke	4.5"H x 2.75"W x .75"D (114mm x 70mm x 19mm)


Token Ring Media Filter
MOD-TAP Token Ring Media Filter

4/16 Mbps Token Ring Media Filter connects a DB-9 adapter to UTP cable. Compatible with IEEE 802.5 devices.

41-103	WE8W 5/4 & 3/6


Uni-Fit
MOD-TAP Uni-Fit

Modular furniture has constantly presented obstacles to high-performance voice and data communications. The Uni-Fit modular furniture outlet meets these challenges and features fully adjustable latches that snap into place in seconds. Simply attach the base plate onto the furniture, snap on the cover, and snap in the terminated module. Each Uni-Fit accommodates up to four voice or data channels.

Uni-Fit works with openings measuring:

•	A minimum of 1.31" High x 2.47" Wide

•	A maximum of 2.35" High x 3.41" Wide

•	Panel thicknesses of .025" - .120"

The Uni-Fit requires a total of up to three part numbers:

•	One Uni-Fit

•	Two USO Modules or Blanks

17-5234-0*	Uni-Fit
Replace (*) with the following USO Color Code:

1=Almond

2=White

4=Black

8=Lt. Grey


Single and Double Gang USO Bezels
MOD-TAP Single and Double Gang USO

The Single and Double Gang USO Bezels are used to hold up to three or six USO modules (up to twelve channels), respectively. Includes screws, screw caps, and icon labels. Modules are ordered separately.

The Single Gang Bezel requires a total of up to four part numbers:

•	One Bezel

•	Three USO Modules or Blanks

The Double Gang Bezel requires a total of up to seven part numbers:

•	One Bezel

•	Six USO Modules or Blanks

17-0121-0*	Single Gang Bezel
17-0121D-0*	Double Gang Bezel
Replace (*) with the following USO Color Code:

1=Almond

2=White

4=Black

8=Lt. Grey


USO Modules
MOD-TAP USO Modules

USO Modules are the key to MOD-TAP configurable products. They exceed all UL and TIA requirements for safety and performance and come in a variety of styles including Category 4 and 5 UTP, ST®, SC, coax, and Dtype. USO modules may be used in the following MOD-TAP configurable products:

•	Single and Double Gang Bezels

•	One and Two Module Surface Blocks

•	Multi User Telecommunications Outlet

•	MMI and MMI-R

•	601-Series Wall Mount Interface

•	Universal System Patch Panels

•	MM-12

•	Uni-Fit

PowerCat Enhanced Performance

PowerCat USO and PassPort Wallplates and IDC Patch Panels offer enhanced performance over Category 5 products. PowerCat products are:

•	Power Sum compliant for cleaner signals and reduced near end cross-talk (NEXT)

•	Tested to 350MHz

•	Designed to eliminate short link resonance problems

•	Exceed the performance specified by TSB-67 channel and basic link limits

Request a copy of MOD-TAP's PowerCat Link brochure for approved Power Sum cable partners.

POWERCAT USO UTP MODULES

17.1P.011.B001*	1 WE8W EIA 568B Jack & 1 Blank
17.1P.017.B001*	1 WE8W EIA 568A Jack & 1 Blank
17.1P.021.B001*	2 WE8W EIA 568B Jacks
17.1P.027.B001*	2 WE8W EIA 568A Jacks
CATEGORY 5 USO UTP Modules

17.1B.021.B001*	2 WE8W EIA 568B Jacks
17.1B.027.B001*	2 WE8W EIA 568A Jacks
17.1B.011.B001*	1 WE8W EIA 568B Jack
17.1B.017.B001*	1 WE8W EIA 568A Jack
17.1B.021.B002*	2 WE8W EIA 568B Jacks with Category 5 imprint
CATEGORY 4 USO UTP Modules

17-51-Y0-6*	1 WE8W EIA 568B Jack
17-51-YY-6*	2 WE8W EIA 568B Jacks
17-51-T0-6*	1 WE8K EIA 568B Jack
17-51-TT-6*	2 WE8K EIA 568B Jacks
17-51-6T-6*	1 WE6W USOC & 1 WE8K EIA 568B Jack
17-51-6Y-6*	1 WE6W USOC & 1 WE8W EIA 568B Jack
17M-51-6Y-6*	1 USOC Category 4 & 1 568B Category 5 Jack
17-51-60-6*	1 WE6W USOC Jack
17-51-66-6*	2 WE6W USOC Jacks
17-51-68-6*	1 WE6W & 1 WE8W USOC Jack
17-51-E0-6*	1 WE8W EIA 568A Jack
17-51-EE -6*	2 WE8W EIA 568A Jacks
17-51-E8-6*	1 WE8W EIA 568A & 1 WE8W USOC Jack
17-51-50-6	1 MMJ RS423 Jack
17-51-55-6*	2 MMJ RS423 Jacks
17-51-56-6*	1 MMJ RS423 & 1 WE6W USOC Jack
17-5214-0*	Dual 8 Wire Feed Through
17-51-80-6*	1 WE8W USOC Jack
17-51-88-6*	2 WE8W USOC Jacks
17-51-89-6*	1 WE8W & 1 WE8K USOC Jack
17-51-90-6*	1 WE8K USOC Jack
17-51-99-6*	2 WE8K USOC Jacks
USO ICON LABELS

35.B017K	USO Icon Labels Yellow (25 sheets/pkg)
35.B018J	USO Icon Labels Green (25 sheets/pkg)
35.B020C	USO Icon Labels Red (25 sheets/pkg)
35.B021H	USO Icon Labels Blue (25 sheets/pkg)
35.B0162	USO Icon Labels White (25 sheets/pkg)
Other USO Modules

17-5223-0*	25 Pin Dtype Connector Kit - Female (Occupies two positions)
17-5222-0*	15 Pin Dtype Connector Kit - Female
17-5221-0*	9 Pin Dtype Connector Kit - Female
17-51-A-0*	1 BNC Connector
17-51-AA-0*	2 BNC Connectors
17-0433-0*	Blank Module
17-51-L-0*	IBM Data Module with Connector (Occupies two positions)
17-0435-0*	IBM Data Module without Connector
17-51-V-0*	1 Video F Connector
17.B166*	1 Video S Connector
17-51-AV-0*	1 BNC and 1 Video F Connector
17.B167*	2 Audio Connectors
17-51-VV-0*	2 Video F Connectors
Replace * with the following USO color code:

1=Almond

2=White

4=Black

8=Lt. Grey


USO Optical Fiber Modules
MOD-TAP USO Optical Fiber Modules

USO Optical Fiber Single Modules

17-5228-0*	Single Module w/2 ST Adapters - SM
17-51-FF-0*	Single Module w/2 ST Adapters - MM
17-5235-0*	Single Module w/1 Duplex SC Adapter - SM
17.B162*	Single Module w/1 Duplex SC Adapter - MM
17.B161*	Single Module w/1 Duplex SC to ST® Adapter - SM
17.B160*	Single Module w/1 Duplex SC to ST Adapter - MM
17-5216-0*	Single Module w/1 Configurable FDDI Adapter - Recommended for patch panel or floor box use only
USO Optical Fiber Angled Modules

17.B159*	Angled Double Module w/1 Duplex SC Adapter - SM
17.B158*	Angled Double Module w/1 Duplex SC Adapter - MM
17.B157*	Angled Double Module w/1 Duplex SC to ST® Adapter - SM
17.B156*	Angled Double Module w/1 Duplex SC to ST® Adapter - MM
17-5215-0*	Angled Double Module w/2 ST® Adapters - MM
17-5213-0*	Angled Double Module w/1 Configurable FDDI Adapter
USO Optical Fiber Double Modules

17.B141*	Double Module w/6 ST® Adapters - SM
17.B140*	Double Module w/6 ST® Adapters - MM
17.B144*	Double Module w/3 Duplex SC Adapters - SM
17.B165*	Double Module w/3 Duplex SC Adapters - MM
17.B164*	Double Module w/3 Duplex SC to ST Adapters - SM
17.B163*	Double Module w/3 Duplex SC to ST Adapters - MM
Replace * with the following USO color code:

1=Almond

2=White

4=Black

8=Lt. Grey


USO Premium Wall Plates
MOD-TAP USO Premium Wall Plates

The Universal System Outlet (USO) is MOD-TAP's premium wall plate system. It is a versatile product designed for the constantly changing voice and data communications needs of today's marketplace.

•	Available in either PowerCat or Category 5 or 4 modules

•	The first truly configurable product introduced to the cabling industry

•	Field configurable - modules snap in / out from the front, so the plate can be changed as system requirements change without removing the bezel from the wall

•	Supports Coax, Fiber, and Type 1 cables

•	Available in four standard colors -  Almond, White, Black, and Grey

•	No special mounting kit required - uses standard US 1 or US 2 box

•	May be used with 22 or 24 AWG  solid or stranded wire

•	Can be private labeled

Individually purchased modules snap easily into the bezel to meet specific application requirements. Up to three different modules fit into a single gang bezel; six in a double gang bezel. Color coordinated blanks are also available. Each module can hold up to two of these popular connectors:

•	6 and 8 wire modular jacks

•	MMJ modular jacks

•	BNCs

•	D Type connectors

•	Fiber connectors

•	Video connectors

An IBM Data Connector module is also available, occupying two positions.

Each bezel fits on a standard US 1 or US 2 wall box. Upgrades and changes may be made at any time using a small screwdriver to remove modules. New ones snap easily to the front without removing the bezel from the wall.


WM-12
MOD-TAP WM-12

The WM-12 is a wall mounted 16 gauge steel enclosure that accepts up to six single or double MOD-TAP USO Modules, providing up to eighteen fiber ports in a minimum of space. This lockable steel unit is the recommended solution where a high level of security is required.

Part No.	Description
15.B033G	WM-12 Wall Mount Fiber Box


Universal System Patch Panels (USP)
MOD-TAP Universal System Patch Panels (USP)

MOD-TAP Universal System Patch Panels (USP) add the ultimate in versatility to any cabling system. Individually purchased USO modules snap in easily, allowing custom configuration and modification of the patching field as required. USO modules come in a variety of media including UTP, fiber, and coax, making it easy to combine media within a single panel.

USP panels are made of steel and have an attractive graphite grey powdercoat finish. They are available in one, two, and three position versions for a total of up to 48 multimedia channels (UTP, fiber, coax, etc.). All USP Panels include rack mounting screws.

The 1U USP Panel is ideal for smaller installations as the panels can be populated as required, thus keeping costs down. The 1U USP Panel requires a total of nine parts:

•	 One 1U USP Panel - Unloaded

•	Eight USO single modules or blanks

The 2U USP Panel is also used in small installations and accepts double USO modules, such as the IBM data module. It requires a total of up to 17 parts:

•	One 2U USP Panel - Unloaded

•	16 USO single modules or blanks

The 3U USP Panel is appropriate for medium sized installations and comes in the form of a kit. The kit consists of one panel, eight bezels, and 16 captive mounting screws. When used in combination with the USO Wall Plate, the 3U USP Panels can match the office outlet, channel for channel, to simplify trouble shooting and maintenance. As moves and changes are made in the office environment, patching changes can be made by simply changing USO modules. The 3U USP Panel can accept double modules; however, for optical fiber applications only, straight fiber modules can be used - not angled fiber. The 3U USP Panel requires a total of up to 25 parts:

•	One 3U USP Panel - Unloaded

•	24 USO single modules or blanks

17.B058G	1U USP Panel - Unloaded
17.B103G	2U USP Panel - Unloaded
17.B059G	3U USP Panel Kit - Unloaded


Wall Mount FMS ST Panel Inserts
MOD-TAP Wall Mount FMS ST® Panel Inserts

Wall Mount FMS ST® Panel Inserts, purchased separately, provide a fixed panel option for the WM FMS Cabinets and are available unloaded or fully loaded with 24, 48, or 72 multimode ST® adapters. For singlemode ST® requirements, order the unloaded panel and ST® adapters separately.

WALL MOUNT FMS ST® PANEL INSERTS

30.B027G	24 Port ST® Panel Insert - Unloaded
30.B028G	24 Port ST® Panel Insert - Loaded MM
30.B029G	48 Port ST® Panel Insert - Unloaded
30.B030G	48 Port ST® Panel Insert - Loaded MM
30.B031G	72 Port ST® Panel Insert - Unloaded
30.B032G	72 Port ST® Panel Insert - Loaded MM


Wall Mount Racks
MOD-TAP Wall Mount Racks

MOD-TAP offers a complete selection of wall mount racks for smaller installations which can be stacked for future expansion.  They are available in 2-, 4-, and 14-positions, shallow and deep mount, and are constructed of black electro-coated steel. The deep mount racks will accommodate the MOD-TAP FMS as well as active equipment. All of the racks can be installed using toggle bolts or wall anchors.

Wall Mounts - Shallow

27-300	2 Position Shallow Wall Mount Rack
25-104	4 Position Shallow Wall Mount Rack
25-114	14 Position Shallow Wall Mount Rack
Wall Mounts - Deep

25-1D-02	2 Position Deep Wall Mount Rack
25-1D-04	4 Position Deep Wall Mount Rack
25-1D-14	14 Position Deep Wall Mount Rack


KATT 601 Connection Box
MOD-TAP KATT 601 Connection Box

The KATT 601 connection box is a durable compact unit designed to be used as a consolidation point for voice and data applications. The box is equipped with a 20 pair KATT connector kit and can be expanded to a maximum 60 pair capacity by using additional connector kits. Simple installation instructions are included

•	Constructed of durable grey high-impact ABS

•	60 Pair Capacity (using additional connector kits)

•	Uses proven KATT IDC technology

•	Minimum 200 reterminations

14-0001-001	KATT 601 Connection Box with 20 pair Connector Kit
14-0002-001	20 Pair KATT Connector Kit


KATT PDS Configurable Frame
MOD-TAP KATT PDS Configurable Frame

The KATT PDS Configurable Frame enables KATT PDS 100 Pair Bases and KATT PDS Ring Runs to be quickly and easily mounted on a wall and ensures a totally square and secure system. The frame is made of sturdy steel and attaches to a wall using four keyhole slots. The components snap to the frame using "Christmas tree" clips (included). Each frame accommodates up to seven 100 Pair Bases and/or Ring Runs. They can be used in multiples to accommodate higher density PDS systems.

36.C0010 KATT PDS Configurable Frame


KATT 100 Pair Base
MOD-TAP KATT 100 Pair Base

36.B0340	100 Pair Base - No Connectors, No Legs
36.B0350	Leg Kit for 100 Pair Base (36.B0340)
36.B0090	100 Pair Base - No Connectors
36.B0070	100 Pair Base - With 48 MKII-2 Connectors
36.B0010	100 Pair Base - With 24 MKII-4 Connectors
36-B0250	100 Pair Base - With 20 MKII-5 Connectors
The 100 Pair Base is the key component in the wall mount KATT PDS System. The wiring strips are notched and marked to quickly identify 5-pair groups when lacing 25-pair backbone cable. The designation strips are marked for 1-, 2, 4-, and 5-pair  connectors and are available in colors to easily identify specific sections of the PDS installation.

All 100 Pair Bases come with legs with the exception of 36.B0340.

KATT 100 Pair Base

Material	Flame Retardant Thermoplastic
Color	Black
Dimensions	3.5" H x 10.75" W x 3.5" D
	(89mm x 273mm x 89mm)
Ship Weight	13 oz. (330g) D  with legs


KATT PDS Wall Mount Frames and Accessories

Components

Part No.	Description
36.C0054	PDS Wall Mt. Frame- 300 pair - unloaded
36.C0064	PDS Wall Mt. Frame - 900 pair - unloaded
36.C0074	PDS Wall Mt  Frame Vertical Drip Tray
36.C0084	PDS Wall Mt  Frame Drip Tray
36.C0094	PDS Wall Mt  Frame Shallow Ring Run
36.C0104	PDS Wall Mt  Frame Deep Ring Run
36.C0114	PDS Wall Mt  Frame Vertical Ring Run
Kits

Part No.	Description
36.C0204	PDS 300 Pair Wall Mt. Frame Kit - Shallow - Unloaded
36.C0214	PDS 300 Pair Wall Mt. Frame Kit - Deep - Unloaded
36.C0224	PDS 300 Pair Wall Mt. Frame Kit - Shallow - with K4 & K5
36.C0234	PDS 300 Pair Wall Mt. Frame Kit - Deep - with K4 & K5
36.C0244	PDS 900 Pair Wall Mt. Frame Kit - Shallow - Unloaded
36.C0254	PDS 900 Pair Wall Mt. Frame Kit - Deep - Unloaded
36.C0264	PDS 900 Pair Wall Mt. Frame Kit - Shallow - with K4 & K5
36.C0274	PDS 900 Pair Wall Mt. Frame Kit - Deep - with K4 & K5
36.C0284	PDS 300 Pair Wall Mt. Frame Vertical Ring Run Kit
36.C0294	PDS 900 Pair Wall Mt. Frame Vertical Ring Run Kit
Recommended for voice and data systems, MOD-TAP's new KATT PDS Wall Mount Frame system is comprised of a rugged steel frame that mounts easily to a wall providing a complete communications facility with ample space behind the unit for incoming cable.  The frame is available in 300 and 900 pair versions that accommodate 100 pair bases and horizontal and vertical cable management rings, plus drip trays to keep excess cable lengths safely off the floor.

The Wall Mount Frame, Drip Trays, and Ring Run Panels are constructed of rugged, black powdercoated steel. The cable management rings on the panels are made of durable Lexan and the Vertical Rings are black powdercoated steel.

The KATT PDS Wall Mount Frame and Accessories can be purchased as individual components or in convenient kit form-unloaded, or loaded with MOD-TAP Category 5 compliant KATT connectors-to suit all application requirements. Kits are packaged according to system density as follows:

300 Pair Kit

•	One Wall Mt. Frame

•	One Wall Mt. Frame Drip Tray

•	Three 100 Pair Bases with designation labels

•	Three Ring Run Panels (shallow or deep depending on kit)

•	20 K4 & 4 K5 Connectors per 100 Pair Base (loaded kits only)

•	Self-tapping screws for mounting components to the frame

900 Pair Kit

•	One Wall Mt. Frame

•	One Wall Mt. Frame Drip Tray

•	Nine 100 Pair Bases with designation labels

•	Nine Ring Run Panels (shallow or deep depending on kit)

•	20 K4 & 4 K5 Connectors per 100 Pair Base (loaded kits only)

•	Self-tapping screws for mounting components to the frame

300 Pair Vertical Ring Kit

•	Three KATT PDS Vertical Rings

•	One Vertical Drip Tray

•	Self-tapping screws for mounting components to the frame

900 Pair Vertical Ring Kit

•	Nine KATT PDS Vertical Rings

•	One Vertical Drip Tray

•	Self-tapping screws for mounting components to the frame


KATT PDS Ring Run Panel
MOD-TAP KATT PDS Ring Run Panel

The KATT PDS Ring Run Panel provides for complete horizontal and vertical cable management in one unique product. It uses MOD-TAP's exclusive rings that speed horizontal cable routing and its integral cable retention feature forms a vertical wiring trough between rows of blocks. In addition, the footprint of the ring run allows its interchange with 100 pair bases in the event a higher density system is needed.

Material	16 Gauge (.06" thick) CRS
Color	Black Electrocoat
Dimensions	4.38"H x 10.75"W x 3.60"D (111mm x 273mm x 91mm)
Shipping Weight	1 lb. (453g)


KATT PDS Drip Tray
MOD-TAP KATT PDS Drip Tray

The KATT PDS Drip Tray is mounted below the bottom row of ring runs on a wall mount KATT PDS System. The drip tray provides for the collection, storage, and support of the additional length of patch cords in the system.

Part No.	Description
36.B0274	KATT PDS Drip Tray
36.B0024	KATT PDS Ring Run


KATT Patch Cord

The MOD-TAP KATT Patch Cord is used to administer voice and data cross connections on KATT block-based circuits. It can be attached to the KATT connector with one wire terminated in the IDC slot. This allows testing of circuits or monitoring of system activity without disrupting customer activity. It comes in several factory configured versions and pair counts to suit all applications. In addition, there is a field terminable version that can be terminated to Category 5 specifications.

•	Circuits can be easily changed by untrained personnel without using a punch down tool.

•	Polarized to prevent accidental reversal of the connectors on the KATT blocks.

•	Low insertion force, typical of all KATT products, eases strain on the installer.

•	Gripping feature makes it easy to remove when several connectors are lined up on a block.

Category 5 4-pair to 4-pair

36.0B.010.B0010	KPC 4PR to 4PR C5 3ft 10/Pkg
36.0B.010.B0020	KPC 4PR to 4PR C5 7ft 10/Pkg
36.0B.010.B0030	KPC 4PR to 4PR C5 10ft 10/Pkg
36.0B.010.B0040	KPC 4PR to 4PR C5 15ft 10/Pkg
Category 3 4-pair to 4-pair

36.0E.010.B0010	KPC 4PR to 4PR C3 3ft 10/Pkg
36.0E.010.B0020	KPC 4PR to 4PR C3 7ft 10/Pkg
36.0E.010.B0030	KPC 4PR to 4PR C3 10ft 10/Pkg
36.0E.010.B0040	KPC 4PR to 4PR C3 15ft 10/Pkg
Category 5 equivalent* 2-pair to 2-pair

36.0E.010.B0050	KPC 2PR to 2PR C5* 3ft 10/Pkg
36.0E.010.B0060	KPC 2PR to 2PR C5* 7ft 10/Pkg
36.0E.010.B0070	KPC 2PR to 2PR C5* 10ft 10/Pkg
36.0E.010.B0080	KPC 2PR to 2PR C5* 15ft 10/Pkg
Category 5 568a 4-pair to RJ45

36.0B.017.B0010	KPC 4PR to RJ45 C5A 3ft 10/Pkg
36.0B.017.B0020	KPC 4PR to RJ45 C5A 7ft 10/Pkg
36.0B.017.B0030	KPC 4PR to RJ45 C5A 10ft 10/Pkg
36.0B.017.B0040	KPC 4PR to RJ45 C5A 15ft 10/Pkg
Category 5 568b 4-pair to RJ45

36.0B.011.B0010	KPC 4PR to RJ45 C5B 3ft 10/Pkg
36.0B.011.B0020	KPC 4PR to RJ45 C5B 7ft 10/Pkg
36.0B.011.B0030	KPC 4PR to RJ45 C5B 10ft 10/Pkg
36.0B.011.B0040	KPC 4PR to RJ45 C5B 15ft 10/Pkg
Category 5 4-pair to unterminated

36.0B.010.B0050	KPC 4PR to UNTRM C5 15ft 10/Pkg
36.B0370	KPC FIELD TERM 4PR KT 20/Pkg
36.B0380	KPC FIELD TERM 2PR KT 20/Pkg
36.B0390	KPC FIELD TERM 1PR KT 20/Pkg
36.0B.011.B0050	KATT Frame Adapter 568B
36.0B.017.B0050	KATT Frame Adapter 568A
Description Legend

C5 = Category 5

C5A = Category 5 568A

C3 = Category 3

C5B = Category 5 568B

KPC = KATT Patch Cord

UNTRM = Unterminated

FIELD TERM = Field Terminated

Note

These  products are manufactured with 2-pair cable that meets the NEXT and Attenuation requirements for Category 5 cable. However, TIA does not recognize these components as Category 5 compliant since Category 5 is a 4-pair specification.


Vertical Cable Organizer

PART #	DESCRIPTION
25.B0564	Vertical Cable Organizer Panel 44-84" (1/pkg)
MOD-TAP's Vertical Cable Organizer Panel is part of a family of rack mounted panels and rings that provide critical cable management and strain relief for your Category 5, fiber, power, or audio cables. They are constructed of rugged steel with a black enamel finish and include Velcro tie wraps to prevent over-compression of your cables. Mounting hardware is included with all of the components.


IDC Punch Down Tools

The MOD-TAP Punch Down Tool provides a reliable connection at a reasonable cost. It is entirely compatible with KATT, 110, and Krone connectors. Its low-impact force prevents damage to connectors. The Scissor style cut-off gives positive wire trimming, even on older blocks.

The IDC Punch Down Tool is an industry standard tool used for terminating individual conductors onto 110 and KATT connectors.

14-0400-001	MOD-TAP Punch Down Tool
31-001	IDC Punchdown Tool with 110 blade
31-001-1	110  Replacement Blade
14-0401-001	KATT Loading Tool
KATT Loading Tool

The KATT Loading Tool is used for loading KATT connectors onto 100 pair bases. This inexpensive, no-impact tool is durable and contains no moving parts.


IDC Frame Mounting Kit

The IDC Frame Mounting Kit allows four 100 pair bases to be mounted in a 19" equipment rack. Blocks are mounted horizontally. The kit includes one panel, all mounting hardware, and occupies five rack positions. 100 pair bases and KATT connectors may be ordered separately.

Part No.	Description
31.B005G	IDC Frame Mounting Kit
36.B0050	KATT-2 Connectors (100/bag)
36.B0060	KATT-4 Connectors (100/bag)
36.B0260	KATT-5 Connectors (100/bag)


MOD-TAP

285 Ayer Road - P.O. Box 706  [image]  Harvard, MA 01451-0706

1-888-2-MOD-TAP  [image]  www.mod-tap.com