CKM834.*, together with CKMKEY.HQX, comprise version 0.8(34) (or is it
0.8(35)?) of Macintosh Kermit, the last version known to run on the original
128K Mac.  It should not be used on larger Macs, and probably doesn't run at
all on the Mac II or SE.
