Copyright: Copyright 1998©


Contents
========================================

CasCADe for Windows can be registered on the Internet at Albert's Ambry.

Albert's Ambry will immediately notify the author of your registration.

The author will then email your keycode, usually within 24 hours.

Registration at Albert's also eliminates shipping and handling costs.

Please go to:

 http://www.alberts.com

 Search on: casc4w.zip

 Click on the "Buy It" Hotlink to register this software.

===========================================

CasCADe v3.12E Professional

The registration price covers a keycode working on one machine, 50 complex drawings and 500 ready-made symbols from all fields. All prices listed are subject of change without prior notice.

Name:     ______________________________________________________

Street:   ______________________________________________________

City:     __________________  State:   _________________________

ZIP-Code: __________________  Country: _________________________

Phone:    __________________  Fax:     _________________________

E-Mail:   ______________________________________________________

I would like to get:

CasCADe v3.12E Professional	(keycode for one machine, 50 complex drawings, 500 mixed symbols)

        199 US $  [   ]

Symbol Libraries for CasCADe for Windows:

Architecture (450 Symbols) 	 	          49 US $  [   ]

Electrical Engineering (700 Symbols)	          49 US $  [   ]

Heating / Sanitary (150 Symbols) 	          29 US $  [   ]

Interior Decoration (300 Symbols)	          49 US $  [   ]

Mechanical Engineering (1 500 Symbols)	          49 US $  [   ]

Pneumatics / Hydraulics (150 Symbols) 	          29 US $  [   ]

Steel Construction (150 Symbols)	          29 US $  [   ]

If you order directly from ISD Juergen Schroeder there are no shipping and handling fees!

____________________________________________

City, name, signature.

You can fax your order to: +49 30 497 66 132 E-mail to: 100544.3524@Compuserve.com or mail to:

ISD Juergen Schroeder

Stockholmer Str.30

D - 13359 Berlin

Germany

I would like to pay with credit card (fastest and easiest way):

Card: 	Visa 	[  ]	Euro-/Mastercard  [  ]

Card number: _ _ _ _ _ _ _ _ _ _ _ _ _ _ _ _ 	Expires at: _ _ / _ _

Credit cards will be charged in german DM according to the current dollar exchange rates.

You can order with creditcard by phone from Tel.: +49 30 497 66 131

You can pay with International Money orders (postal, Amex, Western Union).

If you have a freely convertible national currency you can also pay with any normal national bank

cheque used in your national transfers covering somehow the amount in US$. Please make it payable to

Juergen Schroeder.

You can also transfer freely convertible currencies to our bank account at:

Berliner Sparkasse

Account no.: 350006695

Branch Code: 100 500 00

Please always issue Euro-cheques in your own national currency - otherwise cashing the cheque will cost us more than you pay.

You can also register online with creditcard at Albert's Ambry, The Try-Before-You-Buy Internet

Software Store to be found in the World-Wide-Web at http://www.alberts.com

Members of Compuserve can obtain keycodes via their Compuserve account (GO

SWREG).

You can register with creditcard at the Public Software Library.

You can also register at our national registration sites (all prices listed are subject of change without prior notice):

Argentina	Australia	Canada

Czechia	Denmark 	Finland

France	Germany	Great Britain

Hongkong 	Iceland	India

Italy	Japan	Malaysia

Netherlands	Norway	Portugal

South Africa	Sweden	Taiwan

USA


Argentina

Please ask for prices

Alean SRL

Av. Gaona 2482

(1416) Capital Federal

Buenos Aires

Argentina

Phone: +(54-1) 582-2568

Fax: +(54-1) 958-0315

Email:  alean@einstein.com.ar


Compuserve

Members of Compuserve can obtain keycodes via their Compuserve account (GO

SWREG) where you can order with the following IDs:

CasCADe v3.12E Professional	(keycode for one machine, 50 complex drawings, 500 mixed symbols - 199 US $) as #15664

Architecture (450 Symbols - 49 US $) as #15665

Electrical Engineering (700 Symbols - 49 US $) as #15667

Heating / Sanitary (150 Symbols - 29 US $) as #15670

Interior Decoration (300 Symbols - 49 US $) as #15671

Mechanical Engineering (1 500 Symbols - 49 US $) as #15673

Pneumatics / Hydraulics (150 Symbols - 29 US $) as #15676

Steel Construction (150 Symbols - 29 US $) as #15678

If you order via Compuserve there are no shipping and handling fees!


Australia

all major and most minor creditcards accepted

Software Heaven

P.O. Box 148, Brockvale, NSW 2100

Phone: (02) 9905-7006 * Fax: (02)  9905-3301

Email: jpaulj@ibm.net

CasCADe v3.12E Professional	(keycode for one machine, 50 complex drawings, 500 mixed symbols)  	278,60 AUD

Symbol Libraries for CasCADe for Windows:

Architecture (450 Symbols) 	 	 68,60 AUD

Electrical Engineering (700 Symbols)	 68,60 AUD

Heating / Sanitary (150 Symbols) 	 40,60 AUD

Interior Decoration (300 Symbols)	 68,60 AUD

Mechanical Engineering (1 500 Symbols)	 68,60 AUD

Pneumatics / Hydraulics (150 Symbols) 	 	 40,60 AUD

Steel Construction (150 Symbols)	 40,60 AUD


Canada

Visacard accepted:

WM Ventures

39 Millside Rd. SW

Calgary, Ab.

Canada T2Y 2P9

Tel.: (403) 256-5812

Fax: (403) 256-5820

Internet: MORZUCHW@CADVISION.COM

http://www.netcom.ca/~morzuchw

http://www.cadvision.com/morzuchw

CasCADe v3.12E Professional	(keycode for one machine, 50 complex drawings, 500 mixed symbols)  	278,60 CAD

Symbol Libraries for CasCADe for Windows:

Architecture (450 Symbols) 	 	 68,60 CAD

Electrical Engineering (700 Symbols)	 68,60 CAD

Heating / Sanitary (150 Symbols) 	 40,60 CAD

Interior Decoration (300 Symbols)	 68,60 CAD

Mechanical Engineering (1 500 Symbols)	 68,60 CAD

Pneumatics / Hydraulics (150 Symbols) 	 	 40,60 CAD

Steel Construction (150 Symbols)	 40,60 CAD


Czechia

please ask for prices

JIMAZ s.r.o.

Hermanova 37, 170 00 Praha 7,CZECH REPUBLIC

Internet: jimaz@jimaz.cz

Phone: +42-2-379-498

Fax: +42-2-378-103


Denmark

Postal Giro Account no. in Denmark: 1-649-6472

many creditcards accepted (e.g.: American Express, Diners Club, Eurocard, MasterCard, VISA):

Scandinavian Software Agency

Box 11

SE - 124 21 Bandhagen

Sweden

Phone and Fax + 46 8 99 70 37

Internet: scand@softagency.se

http://www.softagency.se

Please mention the order-IDs:

#DK160 CasCADe v3.12E Professional	(keycode for one machine, 50 complex drawings, 500 mixed symbols)  	1399 DKK

Symbol Libraries for CasCADe for Windows:

#DK160a Architecture (450 Symbols) 	 	 345 DKK

#DK160b Electrical Engineering (700 Symbols)	 345 DKK

#DK160c Heating / Sanitary (150 Symbols) 	 209 DKK

#DK160d Interior Decoration (300 Symbols)	 345 DKK

#DK160e Mechanical Engineering (1 500 Symbols)	 345 DKK

#DK160f Pneumatics / Hydraulics (150 Symbols) 	 209 DKK

#DK160g Steel Construction (150 Symbols)	 209 DKK


Finland

Postal Giro Account no. in Finland: 800057-1090161

many creditcards accepted (e.g.: American Express, Diners Club, Eurocard, MasterCard, VISA):

Scandinavian Software Agency

Box 11

SE - 124 21 Bandhagen

Sweden

Phone and Fax + 46 8 99 70 37

Internet: scand@softagency.se

http://www.softagency.se

Please mention the order-IDs:

#FI160 CasCADe v3.12E Professional	(keycode for one machine, 50 complex drawings, 500 mixed symbols)  	1110 FIM

Symbol Libraries for CasCADe for Windows:

#FI160a Architecture (450 Symbols) 	 	 275 FIM

#FI160b Electrical Engineering (700 Symbols)	 275 FIM

#FI160c Heating / Sanitary (150 Symbols) 	 165 FIM

#FI160d Interior Decoration (300 Symbols)	 275 FIM

#FI160e Mechanical Engineering (1 500 Symbols)	 275 FIM

#FI160f Pneumatics / Hydraulics (150 Symbols) 	 165 FIM

#FI160g Steel Construction (150 Symbols)	 165 FIM


Norway

Postal Giro Account no. in Norway: 0806 1907581

many creditcards accepted (e.g.: American Express, Diners Club, Eurocard, MasterCard, VISA):

Scandinavian Software Agency

Box 11

SE - 124 21 Bandhagen

Sweden

Phone and Fax + 46 8 99 70 37

Internet: scand@softagency.se

http://www.softagency.se

Please mention the order-IDs:

#NO160 CasCADe v3.12E Professional	(keycode for one machine, 50 complex drawings, 500 mixed symbols)  	1599 NOK

Symbol Libraries for CasCADe for Windows:

#NO160a Architecture (450 Symbols) 	 	 399 NOK

#NO160b Electrical Engineering (700 Symbols)	 399 NOK

#NO160c Heating / Sanitary (150 Symbols) 	 239 NOK

#NO160d Interior Decoration (300 Symbols)	 399 NOK

#NO160e Mechanical Engineering (1 500 Symbols)	 399 NOK

#NO160f Pneumatics / Hydraulics (150 Symbols) 	 239 NOK

#NO160g Steel Construction (150 Symbols)	 239 NOK


Iceland

Postal Giro Account no. in Iceland: 602604

many creditcards accepted (e.g.: American Express, Diners Club, Eurocard, MasterCard, VISA):

Scandinavian Software Agency

Box 11

SE - 124 21 Bandhagen

Sweden

Phone and Fax + 46 8 99 70 37

Internet: scand@softagency.se

http://www.softagency.se

Please mention the order-IDs:

#IS160 CasCADe v3.12E Professional	(keycode for one machine, 50 complex drawings, 500 mixed symbols)  	15990 ISK

Symbol Libraries for CasCADe for Windows:

#IS160a Architecture (450 Symbols) 	 	 399 NOK

#IS160b Electrical Engineering (700 Symbols)	 399 NOK

#IS160c Heating / Sanitary (150 Symbols) 	 2390 ISKK

#IS160d Interior Decoration (300 Symbols)	 3990 ISK

#IS160e Mechanical Engineering (1 500 Symbols)	 3990 ISK

#IS160f Pneumatics / Hydraulics (150 Symbols) 	 	 2390 ISK

#IS160g Steel Construction (150 Symbols)	 2390 ISK


Sweden

Postal Giro Account no.in Sweden: 163 24 51 - 9

many creditcards accepted (e.g.: American Express, Diners Club, Eurocard, MasterCard, VISA):

Scandinavian Software Agency

Box 11

SE - 124 21 Bandhagen

Sweden

Phone and Fax + 46 8 99 70 37

Internet: scand@softagency.se

http://www.softagency.se

Please mention the order-IDs:

#SE160 CasCADe v3.12E Professional	(keycode for one machine, 50 complex drawings, 500 mixed symbols)  	1599 SEK

Symbol Libraries for CasCADe for Windows:

#SE160a Architecture (450 Symbols) 	 	 399 SEK

#SE160b Electrical Engineering (700 Symbols)	 399 SEK

#SE160c Heating / Sanitary (150 Symbols) 	 239 SEK

#SE160d Interior Decoration (300 Symbols)	 399 SEK

#SE160e Mechanical Engineering (1 500 Symbols)	 399 SEK

#SE160f Pneumatics / Hydraulics (150 Symbols) 	 239 SEK

#SE160g Steel Construction (150 Symbols)	 239 SEK


France

CB and Eurocard/Mastercard accepted:

There is a french version of CasCADe as well. If you prefer the french version please order it.

ISD France

55 rue Pierre Contant d'Ivry, 66000 Perpignan

Tel: 04 68 66 79 23 * Fax: 04 68 66 57 67

Internet: 100611.3617@Compuserve.com

CIS: 100611,3617

CasCADe v3.12E Professional	(keycode for one machine, 50 complex drawings, 500 mixed symbols)

1094 Frf

Symbol Libraries for CasCADe for Windows:

Architecture (450 Symbols) 	 	 269 Frf

Electrical Engineering (700 Symbols)	 269 Frf

Heating / Sanitary (150 Symbols) 	 159 Frf

Interior Decoration (300 Symbols)	 269 Frf

Mechanical Engineering (1 500 Symbols)	 269 Frf

Pneumatics / Hydraulics (150 Symbols) 	 	 159 Frf

Steel Construction (150 Symbols)	 159 Frf


Germany

Es gibt eine deutsche Version von CasCADE. Falls Sie diese bevorzugen bestellen Sie sie bitte ausdrücklich.

Hausanschrift: Hauptstrasse 40 * 67681 Wartenberg-Rohrbach * Germany/Alemania

Geschaeftsfuehrer / General Manager / Gerente: Juergen Manthey

Tel. +49-(0)-6302/983326	Fax +49-(0)-6302/983327 	Mobil: 0171/6320 398

eMail JM Soft@aol.com

BW-Bank Karlsruhe	BLZ 660 200 20	Kto 403 167 13 00

Postbank Karlsruhe	BLZ 660 100 75	Kto 187181-755

SWIFT BWBKDE6S660	USt-ID# DE144133285


Great Britain

all major creditcards accepted:

Atlantic Coast plc.

The Shareware Village, Colyton, Devon  EX13 6HA, England

Tel. national: 07000 BUYMEE

Tel. international: +44 1297 552222

Fax. (44) 1297 553366

CIS 70007,4726

sales@atlantic-coast.com

Internet:  70007.4726@COMPUSERVE.COM

http://www.atlantic-coast.com

Please mention the order-IDs:

#r3845 CasCADe v3.12E Professional	(keycode for one machine, 50 complex drawings, 500 mixed symbols)  	 £ 149

Symbol Libraries for CasCADe for Windows:

#r3845s1 Architecture (450 Symbols) 	 	 £ 35.99

#r3845s2 Electrical Engineering (700 Symbols)	 £ 35.99

#3845s3 Heating / Sanitary (150 Symbols) 	 £ 21.99

#3845s4 Interior Decoration (300 Symbols)	 £ 35.99

#3845s5 Mechanical Engineering (1 500 Symbols)	 £ 35.99

#3845s6 Pneumatics / Hydraulics (150 Symbols) 	 £ 21.99

#3845s7 Steel Construction (150 Symbols)	 £ 21.99


Hongkong

Good Honest Development Ltd.,

Room 1505 Wealth Commercial Centre,

48 Kwong Wah Street, Hong Kong.

Tel: 27710720

Fax: 23599723

E-mail: chrishkg@hkstar.com

CasCADe v3.12E Professional	(keycode for one machine, 50 complex drawings, 500 mixed symbols)

1532.30 HK$

Symbol Libraries for CasCADe for Windows:

Architecture (450 Symbols) 	 	 377.30 HK $f

Electrical Engineering (700 Symbols)	 377.30 HK $

Heating / Sanitary (150 Symbols) 	 223.30 HK $

Interior Decoration (300 Symbols)	 377.30 HK $

Mechanical Engineering (1 500 Symbols)	 377.30 HK $

Pneumatics / Hydraulics (150 Symbols) 	 	 223.30 HK $

Steel Construction (150 Symbols)	 223.30	HK $


India

Please ask for prices:

Sandeep Jain

37 Defence Enclave

Vikas Marg

Delhi - 110092

India

Phone: 91-11-2214933

Fax:   91-11-4619867

Email: sandeepj@giasdl01.vsnl.net.in


Italy

LiveNET di Valerio Granato

via Silvio Spaventa,27 80142 Napoli ITALY

Modali di pagamento: bonifico bancario, vaglia postale e

(prossimamente) conto corrente postale

Pagina WEB: 	http://www.livenet.it

E-Mail:	sales@livenet.it, livenet@tin.it (quest'ultima ancora per poco)

Telefoni:	+39 81 260175 (voice/FAX)

+39 347 2313456 (contact, programmers, info)

+39 347 3482308 (tech, support, networking)

+39 347 6146830 (acquiring, sales, public relations)

CasCADe v3.12E Professional	(keycode for one machine, 50 complex drawings, 500 mixed symbols)

358 200 Lira

Symbol Libraries for CasCADe for Windows:

Architecture (450 Symbols) 	 	 88 200 Liraf

Electrical Engineering (700 Symbols)	 88 200 Lira

Heating / Sanitary (150 Symbols) 	 52 200 Lira

Interior Decoration (300 Symbols)	 88 200 Lira

Mechanical Engineering (1 500 Symbols)	 88 200 Lira

Pneumatics / Hydraulics (150 Symbols) 	 	 52 200 Lira

Steel Construction (150 Symbols)	 52 200 Lira


Japan

Please ask for prices

P. & A. Shareware

1-3-6-2 Kamisunacho, Tachikawa, Tokyo 190, Japan

Tel: 0425-35-9901 * Fax: 0425-35-9902


Malaysia

please ask for prices

Eracom Sdn. Bhd.

Internet e-mail: eracom@pop.jaring.my

Voice: 603-9853018  Fax: 603-9849593


Netherlands

please make euro-cheques payable in Dutch Guilder only:

JeKa Software

Postbus 62

9930 AB   Delfzijl

Tel.: 0596 - 634477   Fax: 0596 - 634435

Email: jkreitse@inter.NL.net

CasCADe v3.12E Professional	(keycode for one machine, 50 complex drawings, 500 mixed symbols)

329 DG

Symbol Libraries for CasCADe for Windows:

Architecture (450 Symbols) 	 	 79 DG

Electrical Engineering (700 Symbols)	 79 DG

Heating / Sanitary (150 Symbols) 	 49 DG

Interior Decoration (300 Symbols)	 79 DG

Mechanical Engineering (1 500 Symbols)	 79 DG

Pneumatics / Hydraulics (150 Symbols) 	 	 49 DG

Steel Construction (150 Symbols)	 49 DG


Portugal

Fernando Martins

R. Dr. Joao De Barros N. 19 6to. Dto.

1500 Lisboa

PORTUGAL

Phone:  01 - 7151327

Bank account no. 023474710008 BES (Banco Espirito Santo E Comercial De Lisboa)

Internet: cfm@cc.fc.ul.pt

CasCADe v3.12E Professional	(keycode for one machine, 50 complex drawings, 500 mixed symbols)

29850 Esc

Symbol Libraries for CasCADe for Windows:

Architecture (450 Symbols) 	 	 7350 Esc

Electrical Engineering (700 Symbols)	 7350 Esc

Heating / Sanitary (150 Symbols) 	 4350 Esc

Interior Decoration (300 Symbols)	 7350 Esc

Mechanical Engineering (1 500 Symbols)	 7350 Esc

Pneumatics / Hydraulics (150 Symbols) 	 	 4350 Esc

Steel Construction (150 Symbols)	 4350 Esc


South Africa

Please ask for prices

Sharedisk

P.O. Box 1158

Bramley 2018

South Africa

Tel.: +27-11 440-7090

Fax: +27-11 887-7110


Taiwan

Sj Wang

 #89-1, Chushan Rd. Chushan Nantou , Taiwan , R.O.C.

Zip: 557

Fax     : 886-49-656-221

Voice : 886-49-642-010

E-Mail: prince01@ms1.hinet.net

BBS: Single_Life  Fido: 6:720/777   Tel      : 886-49-655-877

CasCADe v3.12E Professional	(keycode for one machine, 50 complex drawings, 500 mixed symbols)

5970 NT$

Symbol Libraries for CasCADe for Windows:

Architecture (450 Symbols) 	 	1470 NT$

Electrical Engineering (700 Symbols)	1470 NT$

Heating / Sanitary (150 Symbols) 	 870 NT$

Interior Decoration (300 Symbols)	1470 NT$

Mechanical Engineering (1 500 Symbols)	1470 NT$

Pneumatics / Hydraulics (150 Symbols) 	 	 870 NT$

Steel Construction (150 Symbols)	 870 NT$


USA

Visacard accepted:

WM Ventures

39 Millside Rd. SW

Calgary, Ab.

Canada T2Y 2P9

Tel.: (403) 256-5812

Fax: (403) 256-5820

Internet: MORZUCHW@CADVISION.COM

http://www.netcom.ca/~morzuchw

http://www.cadvision.com/morzuchw

CasCADe v3.12E Professional	(keycode for one machine, 50 complex drawings, 500 mixed symbols)

        199 US $  [   ]

Symbol Libraries for CasCADe for Windows:

Architecture (450 Symbols) 	 	          49 US $  [   ]

Electrical Engineering (700 Symbols)	          49 US $  [   ]

Heating / Sanitary (150 Symbols) 	          29 US $  [   ]

Interior Decoration (300 Symbols)	          49 US $  [   ]

Mechanical Engineering (1 500 Symbols)	          49 US $  [   ]

Pneumatics / Hydraulics (150 Symbols) 	          29 US $  [   ]

Steel Construction (150 Symbols)	          29 US $  [   ]


Public Software Library

You can order CasCADe as # 15323 with MC, Visa, Amex or Discover from Public (Software) Library by calling

713-524-6394 Extension:15323 or 800-242-4775 Extension:15323

or by FAX to 713-524-6398 or by Email to 71355.470@Compuserve.com

or CIS-email: 71355.470

You can also mail credit card orders to PsL at

PSL

PO Box 35705,

Houston,

TX 77235-5705

PSL needs the cardholder's name exactly as it appears on the customers credit card plus the billing

address for the card. PSL's office hours are: Monday-Thursday from 7:00 a.m. to 6:00 p.m. CST and 7:00

a.m. to 12:30 p.m. CST on Fridays.

THE ABOVE NUMBERS ARE FOR ORDERS ONLY. FOR QUESTIONS AND COMPLAINTS PLEASE

CONTACT ISD JUERGEN SCHROEDER

Any questions about the status of the shipment of the order, refunds, registration options, product details,

technical support, volume discounts, dealer pricing, site licences, etc, must be directed to

ISD Juergen Schroeder

Wriezener Str.41

D - 13359 Berlin

Germany

Phone: +49 30 497 66 131 	Fax: +49 30 497 66 132

Internet:  100544.3524@Compuserve.Com	CIS: 100544,3524

PSL will notify us the day of your order and we will ship the product directly to you.

Please specify CasCADe or # 15323 to order the symbol libraries.

CasCADe v3.12E Professional	(keycode for one machine, 50 complex drawings, 500 mixed symbols)

        199 US $  [   ]

Symbol Libraries for CasCADe for Windows:

Architecture (450 Symbols) 	 	          49 US $  [   ]

Electrical Engineering (700 Symbols)	          49 US $  [   ]

Heating / Sanitary (150 Symbols) 	          29 US $  [   ]

Interior Decoration (300 Symbols)	          49 US $  [   ]

Mechanical Engineering (1 500 Symbols)	          49 US $  [   ]

Pneumatics / Hydraulics (150 Symbols) 	          29 US $  [   ]

Steel Construction (150 Symbols)	          29 US $  [   ]