
VDC-52684: REG 1-H.DSPL  6-V.DSPL  12/13-DSPL.ST  20/21-ATTR.ST  24/25-V/H.SCRL
               2-H.SYNC  7-V.SYNC  18/19-UPDT.ST  32/33-BLK.ST   30/31-WRD/DATA

"U" CMDS : 1541-"U0>M0"  HEAD #0-"U0>H0"  CHANGE DEVICE-"U0>"+CHR$(N)-[8-30]
           1571-"U0>M1"  HEAD #1-"U0>H1"  COLD START (RESET)-"UJ" OR "U:"

PRSVD RAM: $0C00-0DFF, $1300-1BFF, $1C00-1FFF, $2000-3FFF AND $4000-FF00

CLR BASIC: POKE45,1:POKE46,28:POKE4624,3:POKE4625,28:POKE7169,0:POKE7170,0
   MEMORY                       (BYTES)               (CHKSUM)          (28)
BINARY   : BLOAD"FILE1",B0,P(DEC("1300")) THEN, BLOAD"FILE2",B1,P(DEC("1300"))
   VERIFY  [ACCESS MONITOR, ENTER "M 1300" THEN "M" TILL END OF FILE; NOTE LOC]
           C 1300 XXXX 11300 - MONITOR WILL COMPARE AND REPORT DIFFERENCES.

FAST H/L : HB=INT(LOC/256):LB=LOC AND 255 [ HB=INT(LOC/256):LB=LOC-(HB*256) ]
LOCK-UP  : [RUN/STOP]-[RESET] THEN X - RESET TO MONITOR, X TO EXIT, CHK PRGM

SAVE *   : DOPEN#8,"FNAME",S,M (OR "COPY") - CHECK & RESAVE SPLAT FILE, COLLECT
: W/FNAME: DSAVE"FNAME [SHFT]-[SPC] [SHFT]-[@]": - LOAD FROM DIR, W/O MOD.
NML FKEYS: BANK15:SYS49425:SYS52526 - WILL RESTORE