LIBRARY RXGWA INITINSTANCE

DESCRIPTION '@ Freeware by Gerald W. am Ende'
PROTMODE
DATA MULTIPLE NONSHARED LOADONCALL

; Note that the exact case of the exported routine name given here
; must match the case of the function as written in the source
; program.
EXPORTS
       E2A
       A2E
