FIGURE 4 Bouguer gravity anomalies in Fennoscandia

0˚

0˚

10˚E

10˚E

20˚E

20˚E

30˚E

30˚E

40˚E

40˚E

55˚N 55˚N

60˚N 60˚N

65˚N 65˚N

70˚N 70˚N

-140 -70 -50 -40 -30 -20 -10 -0 10 20 30 50 90 140 200

mGal