Usage: labmult [-L#][-C#][-B#][-N#] filename.typ

     This program outputs the mailing labels from the indicated file. 
The number of labels to print is indicated by the -N option, and the
default value is 10. 
     This program assumes a standard mailing label of 8 lines by 40
columns with a blank line between labels.  Lines beginning with a double
quote (") are interpreted literally and are output without centering. 
Lines beginning with a semicolon (;) are treated as comments.  Blank
lines are ignored. 
     The options can be used to change the default values of the label
parameters.  The -L# sets the number of lines on the label, -C# sets the
number of columns, and -B# sets the number of blank lines between
labels.  The -N# sets the number of labels to something other than the
default. 
     Diagnostics are recorded in the log file LABMULT.LOG.
