Usage: labalign [-L#] [-C#] [-B#] [-N#]

	This program outputs a series of alignment labels to help the
user align the mailing labels in his printer. 

   Available options are:
   	-L# - set the number of text lines per label (default 8)
   	-C# - set the number of columns per label (default 40)
   	-B# - set the number of blank lines between labels (default 1)
   	-N# - set the number of labels to print (default 5)
