╔══════════════════════════════════════════════════════════════════════════════╗
║ OMNI - Serial file transfer using the OMI.EXE program.                       ║
║                                                                              ║
║ OMNI (or OMI) streamlined terminal emulation                                 ║
║                                                                              ║
║ <F1>       - display this help screen                                        ║
║ <F2>       - set normal attribute, clear input buffer, stop trigger search   ║
║ <CtrlF2>   - set normal attribute, restart trigger search                    ║
║ <AltF2>    - toggle column number display in top right corner of screen      ║
║ <F3>       - pause display (works better than ^S)                            ║
║ <F4>       - resume display (instead of ^Q)                                  ║
║ <F7>       - toggle LOG file (column number flashes when LOG file is active) ║
║ <F8>       - send DEL character (UNIX interrupt)                             ║
║ <F9>       - send break to host computer                                     ║
║ <F10>      - exit OMI (or AltX)                                              ║
║ <CtrlHome> - redisplay recent text that has scolled off the screen           ║
║ <CtrlPgUp> - upload file using OMNI protocol                                 ║
║ <CtrlPgDn> - download file using OMNI protocol                               ║
║                                                                              ║
║                                                                              ║
║                                                                              ║
║                                                                              ║
║                                                                              ║
║ (c) 1994 P. C. Softsmith                         Type <ESC> to leave help:   ║
╚══════════════════════════════════════════════════════════════════════════════╝
